\begin{table}%t3
       \caption{\label{tab_eros_1}Hard X-ray detected EROs.}
%\centering
\par
\begin{tabular}{rccccccccccc}
\hline\hline                                              
ID     &
RA(X)       &    
Dec(X)      &
$\Delta$(X~--~$O$) &
$R$ (2$''$)      &
$K$ (2$''$)      &     
$R-K$    &
$F_{2-10~\rm keV}$ & 
$HR $     &
log(X/$O$)  &
log(X/$K$)  & 
 $LR$($K$) \\
 & (J2000) & (J2000) & $''$ &  &  & & \cgs & & & & \\
\hline
\multicolumn{12}{c}{5$\sigma$ ERO sample} \\ 
148 & 222.40681 &   9.05575 & 0.37 & 25.24 & 18.76 & 6.48 & 
	2.9e-14 & --0.44 & 2.06   &   0.97  & 15.78 \\
195 & 222.23720 &   9.02275 & 1.73 & 24.11 & 18.32 & 5.79 &  
	2.5e-14  &  0.00 & 1.54  & 0.73  & 15.58 \\
209 & 222.39636 &   9.00872 & 0.64 & 23.27 & 18.08 & 5.19 & 
	9.5e-15  &  --0.54 & 0.78  &    0.21 & 22.96 \\ 
293 & 222.35330 &   8.94158 & 2.81 & 24.26 & 19.13 & 5.13 & 
        9.1e-15  & $>$$0.76$ & 1.16  & 0.61  & 4.92 \\
239 & 222.30940 &   8.85337 & 0.40 & 23.96 & 18.23 & 5.73 & 
        8.9e-15   & --0.19 & 1.03  & 0.24 & 23.84 \\ 
146 & 222.41489 &   9.05666 & 2.31 & 25.63 & 19.10 & 6.53 &  
        6.5e-15  &  0.01 &  1.56  & 0.45  & 7.23 \\
189 & 222.26312 &   9.02621 & 2.02 & 24.40 & 19.04 & 5.36 & 
        5.8e-15  & $>$$0.32$ & 1.02  & 0.38  & 8.73 \\
250 & 222.43523 &   8.97954 & 1.36 & 23.50 & 18.47 & 5.03 & 
        5.8e-15  & $>$$0.42$ & 0.66  & 0.15  & 14.69 \\
\hline
\multicolumn{12}{c}{ 3$\sigma$ ERO sample} \\ 
     175 & 222.32430 &   9.03741 & 1.44 & 24.39 &  19.35 & 5.04  &
      7.9e-15  & 0.12 & 1.24  & 0.43 & -- \\
\hline
\end{tabular}
\end{table}