\begin{table}%t6[p]
%\centering
\par
\caption{Mean number of explosive events expected to coincide with the blinkers and the standard deviation from the mean. R (N) indicates whether the hypothesis can be rejected (or not). In the cases marked *, the probability is either greater than 1.0 and hence has broken down, or the probability is less than 0.01.\label{be_prob}}
\begin{tabular}{lcccc}
\hline\hline
 & \multicolumn{3}{c}{BIPB} \\
 & $P_0$ & $P_{50}$ & $P_{100}$ \\
\hline
\% blinker coverage & 6.7 & 6.7 & 6.7 \\
Area ratio & 0.1 & 0.1 & 0.1 \\
$P$ & 0.12 & 0.07 & 0.03 \\
No of EE's ($n_{\rm e}$) & 8 & 8 & 8 \\
No of Coincident EE's & 1 & 1 & 1 \\
Mean ($\mu$) & 0.9 & 0.5 & 0.3 \\
Standard Deviation ($\sigma$) & 0.95 & 0.7 & 0.5 \\ 
Hypothesis (R/A) & A & A & A \\
\hline
 & \multicolumn{4}{c}{BP A} \\
 & $P_0$ & $P_{50}$ & $P_{100}$ & $P_{\rm C}$\\
\hline
\% blinker coverage & 23.1 & 23.1 & 23.1 & 23.1\\
Area ratio & 0.9 & 0.9 & 0.9 & 0.9\\
$P$ & 0.89 & 0.23 & 0.01* & 0.22\\
No of EE's ($n_{\rm e}$) & 18 & 18 & 18 & 18\\
No of Coincident EE's & 13 & 13 & 13 & 13\\
Mean ($\mu$)& 16 & 4.1 & 0.0 & 3.9\\
Standard Deviation ($\sigma$) & 1.3 & 1.8 & 0.0 & 1.7\\ 
Hypothesis (R/A) & R & R & R & R\\
\hline
 & \multicolumn{4}{c}{BP B} \\
 & $P_0$ & $P_{50}$ & $P_{100}$ & $P_{\rm C}$\\
\hline
\% blinker coverage & 18.7 & 18.7 & 18.7 & 18.7\\
Area ratio & 1.2 & 1.2 & 1.2 & 1.2\\
$P$ & 0.83 & 0.19 & 0.01* & 0.23\\
No of EE's ($n_{\rm e}$) & 68 & 68 & 68 & 68\\
No of Coincident EE's & 37 & 37 & 37 & 37\\
Mean ($\mu$)& 56.2 & 12.7 & 0.1 & 15.4\\
Standard Deviation ($\sigma$) & 3.1 & 3.2 & 0.4 & 3.5\\
Hypothesis (R/A) & R & R & R & R\\
\hline
 & \multicolumn{4}{c}{BP C} \\
 & $P_0$ & $P_{50}$ & $P_{100}$ & $P_{\rm C}$\\
\hline
\% blinker coverage & 19.6 & 19.6 & 19.6 & 19.6\\
Area ratio & 1.3 & 1.3 & 1.3 & 1.3\\
$P$ & 0.90 & 0.20 & 0.01* & 0.26\\
No of EE's ($n_{\rm e}$) & 5 & 5 & 5 & 5\\
No of Coincident EE's & 4 & 4 & 4 & 4\\
Mean ($\mu$)& 4.5 & 1.0 & 0.0 & 1.3\\
Standard Deviation ($\sigma$) & 0.7 & 0.9 & 0.1 & 1.0\\
Hypothesis (R/A) & A & R & R & R\\
\hline
 & \multicolumn{4}{c}{BP D} \\
 & $P_0$ & $P_{50}$ & $P_{100}$ & $P_{\rm C}$\\
\hline
\% blinker coverage & 11.5 & 11.5 & 11.5 & 11.5\\
Area ratio & 1.0 & 1.0 & 1.0 & 1.0\\
$P$ & 0.45 & 0.12 & 0.01* & 0.11\\
No of EE's ($n_{\rm e}$) & 43 & 43 & 43 & 43\\
No of Coincident EE's & 15 & 15 & 15 & 15\\
Mean ($\mu$)& 19.3 & 4.9 & 0.0 & 4.7\\
Standard Deviation ($\sigma$) & 3.3 & 2.1 & 0.1 & 2.0\\
Hypothesis (R/A) & A & R & R & R\\
\hline
 & \multicolumn{4}{c}{BP E} \\
 & $P_0$ & $P_{50}$ & $P_{100}$ & $P_{\rm C}$\\
\hline
\% blinker coverage & 35.5 & 35.5 & 35.5 & 35.5\\
Area ratio & 1.2 & 1.2 & 1.2 & 1.2\\
$P$ & 0.99* & 0.36 & 0.01* & 0.41\\ 
No of EE's ($n_{\rm e}$) & 54 & 54 & 54 & 54\\
No of Coincident EE's & 29 & 29 & 29 & 29\\
Mean ($\mu$)& 53.5 & 19.2 & 0.1 & 22.0 \\ 
Standard Deviation ($\sigma$) & 0.7 & 3.5 & 0.3 & 3.6\\
Hypothesis (R/A) & R & R & R & R\\  
\hline
\end{tabular}
\end{table}