\begin{table}%t5
%\centering
\par
\caption{Properties of blinkers identified in full and reduced time\protect
 resolution  SUMER data and in a single slit of the CDS data.}
\begin{tabular}{lccc}
\hline\hline
Property& SUMER & SUMER & CDS\\
& Full & Reduced& Single slit\\
\hline
No of blinkers & 16 & 35 & 11\\
Mean intensity \% increase& 90 & 100 & 70\\
Mean area (Mm$^{2}$)& 2.4 & 2.8 & 21.3\\
Mean lifetime (minutes)& 2.8 & 16.8 & 17.3\\
\hline
\end{tabular}
\label{sumer_blink}
\end{table}