\begin{table}%t5
%\centering
\par
\footnotesize
\caption{Log of the analyzed {\it Chandra} and {\it XMM} Observations.\label{tab:xlog}}
\begin{tabular}{ccc}
\hline\hline
Detector/Modes & Observation  & Exposure/Frame\\ 
\hline
{\it Chandra} ACIS-S  & Date: 02-Nov.-2001 &  5.1 ks      \\
 Faint/Timed          & Seq. 600121       & 1/4 Subarray \\ 
{\it XMM} PN          & Date: 10-Apr.-2002 &  5.1 ks      \\
  Thin                & Seq. 0112520601   & PrimeFullWindow \\ 
{\it XMM} PN          & Date: 16-Apr.-2002 & 11.1 ks      \\
  Thin                & Seq. 0112522201   & PrimeFullWindow \\ 
{\it XMM} PN          & Date: 18-Sep.-2002 &  5.0 ks      \\
  Thin                & Seq. 0112520901   & PrimeFullWindow \\ 
\hline
\end{tabular}
\end{table}