\begin{table}%t1
\caption{A list of the detected runaway OB star candidates.}\label{tab1}
%\centerline
{
\begin{tabular}{cccccccccccc}
\hline \hline
{\it HIP} & {\it HD/BD} & Sp.~type & ${(v_{\rm t})}_{\rm pec}$&$v_{\rm
tr}$&
 ${(v_{\rm t})}_{\rm pec}^*$ & {\it HIP} & {\it HD/BD} & Sp.~type & ${(v_{\rm t})}_{\rm pec}$&$v_{{\rm tr}}$&
 ${(v_{\rm t})}_{\rm pec}^*$\\
 &&& km~s$^{-1}$ & km~s$^{-1}$  &km~s$^{-1}$
&&&& km~s$^{-1}$ & km~s$^{-1}$ & km~s$^{-1}$ \\
\hline
2702 &3175  &     B5III&           95.05&     62.57&               &  73~720&  133~294 &B8II&             87.21&         107.05&          \\
4384&   5342   &B8II&             56.60&         43.04&      10.68 & 73~778  &132~791&     B9II/III&    83.88&      126.20&          \\
5778&   7374&   B8III&          62.38&          59.47&       34.80 &  74~660  &134~959 &    B2Ia  &         82.22&      98.33&          \\
13~489 &18~100 &     B5II/III&       131.68&     111.01&             &  75~711  &137~595   &B2II/III &       228.81&       245.44&        \\
14~514  &19~374  &    B1.5V   &       78.47&      67.40&    39.79    & 80~338 &147~648&     B8II&         158.57&     171.62&     7.16 \\
\\
24~575 &  34~078  & O9.5Vvar&        120.19&        107.00& 103.76&  81~153 &149~363 &     B0.5III &       145.30&    156.09&        \\
26~272 &36~879  &     O7.5III &       81.47&     89.12 &             & 81~362 &  149~881 & B0.5III &        64.25 &        48.85&        \\
27~204 &  38~666  & B1IV/V  &        78.81 &       67.06 &   51.20  &  81~696 &150~135 &     O7V     &       87.34&     84.67 &        \\
29~147 &  41~997  & O7      &        75.90 &        84.35&          &  81~904&  150~608& B9II/III&       66.67&          81.17&       30.99\\
29~201 & 42~259  & B0V     &        85.91 &        90.20&   25.97   &  82~171 &150~898 &     B0Iab   &       133.23&    162.39&        \\
\\
29~317  &41~689  &    B1Vn... &       95.29&      91.02&            &  82~217&  151~346& B8II&           104.01&         116.06&      15.33\\
29~678 &  43~112  & B1V     &        98.73 &       93.49 &   58.17  &  82~625&  152~160& B8/B9II&        95.83&          113.49&      \\
30~071 &44~182&      B8II&         57.51&      42.39&               &  83~509 &153~772&     B2V&            73.35&      59.32&          \\
31~365   &259~954  &B2IV     &       76.21&        70.19 &          &  87~164  &161~653 &    B2II    &       59.53&      54.83&    19.46 \\
34~117  &53~269&      B9III&       145.43&     143.53&               &  87~287  &162~365 &    B2IV&           61.57&      54.52&          \\
\\
35~707 &57~682  &     O9V     &       98.81&     96.97 &             &89~902   &167~806  &B2V     &        80.85&         80.42&    40.14\\
36~243  &58~683&      B8III&       69.61&       82.63&     59.80     &90~074   &168~733 &B7Ib/II&          120.12&        133.71&     10.28\\
36~799&  60~930&  B9II&           150.70&       198.75&    24.29    &100~170  &192~273&     B2V&            61.37&      74.16&          \\
38~184  &63~655&      B8/B9II&     56.20&       49.85&     33.58     &101~350&  195~965 & B0V     &        69.63 &       61.62 &   31.34\\
41~603&  71~833  &B8II&             109.38&     92.307&     39.30    &101~729 &+45 3230&   B0III   &       68.22&      31.64&         \\
\\
46~592 & 82~011  &B9III  &        86.16 &      93.91  &              &102~999  &198~846 &B0IVv SB &       129.64&       159.53 &        \\
47~370 &83~866&      B8II&         91.20&      149.51&    11.47      &104~361  &201~522 & B0V     &        63.74 &       33.20 &   7.44 \\
48~128  &84~971  &    B2V &           73.15&      43.17&             &105~811  &204~172 &    B0Ib    &       74.04&      79.53&        \\
48~715  &86~606  &    B1Ib    &       194.03&     147.28&   69.82    &106~917  &205~805&     B7III&        935.12&     952.91&    84.11 \\
54~524 &   ---&     B6III&        123.87&     170.64&    17.65      &110~266  &212~043&B6II&             133.41&        117.92&     17.79\\
\\
55~051   & 97~991  & B1V     &       269.90&       243.86&           &111~086 &213~236&     B8II&        213.87&      225.26&    30.84 \\
57~870 &103~101&     B4III&          142.78&     161.30&   42.03     &111~544  &214~168  &B2V     &        60.28&          52.33&          \\
65~890 &  116~852 & O9Ib    &        120.80&        91.46&           &111~563 &214~080   &B1/B2Ib  &       238.49&       255.13&         \\
66~524   &118~450  &B5II    &        383.90&         422.62&  108.52  &112~022  &214~930  &B2IV     &       68.23&        71.43 &        \\
69~640   &124~300  &B2V     &        49.80&         12.32&    18.43  &113~735 &217~505 &    B2III/IV&       85.50&      125.80&         \\
\\
       &        &         &             &              &           &114~998 &219~639 &B5II/III&              98.93& 106.94&            \\
\hline
\end{tabular}}
\medskip
Notes: Entries are ordered by the increasing HIPPARCOS number of a star. The values for
${(v_{\rm t})}_{\rm pec}^*$ which have unreliable HIPPARCOS
distance estimates  (with relative uncertainties more than 50\%)
are missed.
\end{table}