\begin{table}%t2
%\centering
 \caption{The primary list of sources detected at 15~$\mu$m. The columns are (from left to right):
source identification number in order of increasing Right Ascension; source flux and precision before
calibration (in ADUgs); source flux and precision after calibration (in mJy); Right Ascension and Declination of
the infrared source (J2000); redshift and name of the optical counterpart, if known. The redshift of source
ISO\_Cl0024\_02 was taken from Schmidt et~al. (\cite{1986ApJ...306..411S}). All other redshifts are from Czoske
et~al. (\cite{2001AetA...372..391C}) or provided by T. Treu (private communication). The names of the stars are
from HEASARC.\label{lw3}}
%\renewcommand{\arraystretch}{1.15}
     \begin{tabular}{ccccccccc}
         \hline
         \hline
        \noalign{\smallskip}
Source ID  & Signal & Precision   &  Flux &  Precision  &   RA     &   Dec       &   $z$      & Name of optical     \\
ISO\_Cl0024& (ADU)  & ($\pm$ADU) & (mJy) & ($\pm$mJy) & (J2000)    & (J2000)     & if known & counterpart if known\\
\hline
\noalign{\smallskip}
01&    0.634 &0.090 &   0.786&  0.120&    00 26 24.3 & +17 08 18.0&  Star  & TYC 1180-82-1  \\
02&    0.472 &0.060 &   0.577&  0.090&    00 26 26.3 & +17 09 39.0&  0.959 & PC 0023+1653   \\
03&    0.256 &0.060 &   0.298&  0.080&    00 26 27.0 & +17 09 11.7&  Star  & N3231320329    \\
04&    0.298 &0.060 &   0.352&  0.080&    00 26 30.8 & +17 09 44.8&  --     &                \\
05&    0.184 &0.060 &   0.205&  0.080&    00 26 30.7 & +17 09 03.5&  0.3935&                \\
06&    0.230 &0.060 &   0.264&  0.080&    00 26 30.9 & +17 10 29.4&  --     &                \\
07&    0.217 &0.060 &   0.247&  0.080&    00 26 31.0 & +17 09 37.4&  --     &                \\
08&    0.610 &0.090 &   0.755&  0.120&    00 26 31.0 & +17 10 15.6&  0.4005&                \\
09&    0.286 &0.060 &   0.336&  0.080&    00 26 31.5 & +17 10 21.4&  0.2132&                \\
10&    0.191 &0.060 &   0.214&  0.080&    00 26 31.8 & +17 10 03.5&  0.4000&                \\
11&    0.220 &0.060 &   0.251&  0.080&    00 26 35.5 & +17 09 59.1&  0.5558&                \\
12&    0.182 &0.060 &   0.202&  0.080&    00 26 35.9 & +17 10 36.4&  0.3860&                \\
13&    0.210 &0.060 &   0.238&  0.080&    00 26 35.9 & +17 11 39.9&  --     &                \\
14&    0.293 &0.060 &   0.346&  0.080&    00 26 36.6 & +17 07 44.4&  Star  &  EO903-0219757 \\
15&    0.170 &0.060 &   0.186&  0.080&    00 26 36.6 & +17 10 25.4&  --     &                \\
16&    0.260 &0.060 &   0.302&  0.080&    00 26 37.7 & +17 11 33.4&  --     &                \\
17&    0.253 &0.060 &   0.293&  0.080&    00 26 38.9 & +17 08 03.9&  --     &                \\
18&    0.634 &0.090 &   0.786&  0.120&    00 26 40.4 & +17 09 28.7&  0.394 &                \\
19&    0.187 &0.060 &   0.208&  0.080&    00 26 40.6 & +17 11 44.9&  --     &                \\
20&    0.262 &0.060 &   0.305&  0.080&    00 26 40.7 & +17 09 54.0&  0.7125&                \\
21&    0.191 &0.060 &   0.213&  0.080&    00 26 41.3 & +17 11 01.4&  0.3924&                \\
22&    0.334 &0.060 &   0.398&  0.080&    00 26 41.8 & +17 09 52.9&  0.3935&                \\
23&    0.282 &0.060 &   0.331&  0.080&    00 26 42.7 & +17 09 41.6&  --     &                \\
24&    0.189 &0.060 &   0.211&  0.080&    00 26 42.8 & +17 08 48.5&  0.3954&                \\
25&    0.200 &0.060 &   0.225&  0.080&    00 26 42.9 & +17 08 31.7&  0.9174&                \\
26&    0.324 &0.060 &   0.385&  0.080&    00 26 43.1 & +17 08 25.1&  0.3961&                \\
27&    0.373 &0.060 &   0.449&  0.080&    00 26 43.2 & +17 09 11.7&  0.3932&                \\
28&    0.120 &0.060 &   0.122&  0.080&    00 26 45.5 & +17 08 30.8&  --     &                \\
29&    0.946 &0.110 &   1.191&  0.140&    00 26 47.9 & +17 08 12.0&  Star  &  EO903-0219375 \\
30&    0.489 &0.070 &   0.598&  0.090&    00 26 48.0 & +17 09 15.7&  --     &                \\
\hline
      \end{tabular}
\end{table}