\begin{table}%t1
%\centering
\par
\caption{\label{tab_arec:no-counterpart}Arecibo OH/IR stars without
optical/near-infrared counterpart. Coordinates are from radio
interferometry ($N=2$) or from MSX.}
\begin{tabular}[t]{cllrrrrccl}
\hline\hline\noalign{\smallskip}
      &              &                  & \multicolumn{2}{c}{MSX$-$IRAS}  & \multicolumn{2}{c}{VLA--IRAS}   &          &     &             \\
 IRAS & \multicolumn{2}{c}{Coordinates} & $\Delta\alpha$ & $\Delta\delta$ & $\Delta\alpha$ & $\Delta\delta$ & MSX6C\_G & VAR & Other names \\
      & \multicolumn{2}{c}{(J2000)}     & [\arcsec]      & [\arcsec]      & [\arcsec]      & [\arcsec]      &          &     &             \\
\hline\noalign{\smallskip}\noalign{\smallskip}
\object{18475+0353}   & 18 50 00.5  & +03 56 33   &     6 &    1 &   &   & 036.2795+02.1143   & 99 & \\
\object{18498$-$0017} & 18 52 22.2  & $-$00 14 11 &  $-$2 & $-$2 &   &   & 032.8276$-$00.3152 & 96 & OH~32.8-0.3 \\
\object{18501+0013}   & 18 52 40.02 & +00 16 46.9 &     4 &    0 & 5 & 0 & 033.3208$-$00.1459 & 15 & \\
\object{18517+0037}   & 18 54 20.8  & +00 41 05   &  $-$2 &    3 &   &   & 033.8728$-$00.3350 & 85 & GLMP 842\\
\object{18596+0315}   & 19 02 06.3  & +03 20 16   &  $-$2 &    1 &   &   & 037.1185$-$00.8473 & 17 & OH~37.1-08, GLMP 862 \\
\object{19006+0624}   & 19 03 03.4  & +06 28 54   &     1 &    2 &   &   & 040.0220+00.3818   & 16 & \\
\object{19374+1626}   & 19 39 39.2  & +16 33 41   & $-$17 & $-$3 &   &   & 053.1355$-$02.7609 & 60 & GLMP 939\\
\object{19440+2251}   & 19 46 09.27 & +22 59 24.0 &     6 &    0 & 7 & 0 & 059.4784$-$00.8969 & 16 &  \\\hline
\end{tabular} 
\end{table}