\begin{table}%T3
\caption{Results of harmonic fits to the Geneva lightcurves of HD~121190. A
stands for the amplitude, expressed in  millimag, and $\phi$ for the phase,
expressed in 2$\pi$ radians. 
The adopted reference epoch for $\phi=0.0$ corresponds to HJD 2~450~000.0.}
\label{freqtabel}
%\centering
\par
\begin{tabular}{ccccccccc}
\hline\hline
&& $U$ & $B_1$ & $B$ & $B_2$ & $V_1$ & $V$ & $G$ \\
\hline
$f_1$ & A & $9.7\pm1.0$ & $6.3\pm0.8$ & $5.8\pm0.8$ & $5.9\pm0.8$ &
$4.5\pm0.8$ & $4.8\pm0.7$ & $4.3\pm0.8$ \\
 & $\phi$ & $0.814\pm0.016$ & $0.822\pm0.021$ & $0.822\pm0.021$ & 
$0.806\pm0.023$ & $0.839\pm0.030$ & $0.812\pm0.024$ & $0.820\pm0.030$ \\ 
$f_2$ & A & $8.9\pm0.8$ & $4.7\pm0.6$ & $4.4\pm0.6$ & $3.7\pm0.7$ &
$3.4\pm0.6$ & $3.9\pm0.6$ & $3.4\pm0.6$ \\
 & $\phi$ & $0.019\pm0.012$ & $0.001\pm0.021$ & $0.007\pm0.020$ & 
$0.006\pm0.028$ & $0.986\pm0.032$ & $0.982\pm0.026$ & $0.996\pm0.029$ \\ 
$f_3$ & A & $5.2\pm1.0$ & $2.5\pm0.9$ & $2.9\pm0.8$ & $1.8\pm0.7$ &
$2.7\pm0.8$ & $2.6\pm0.8$ & $2.1\pm0.8$ \\
 & $\phi$ & $0.351\pm0.033$ & $0.356\pm0.055$ & $0.369\pm0.044$ & 
$0.249\pm0.057$ & $0.386\pm0.051$ & $0.379\pm0.048$ & $0.359\pm0.064$ \\ 
\hline
\multicolumn{2}{c}{Variance}& 72\% & 57\% & 58\% & 46\% & 43\% & 51\% & 42\% \\
\multicolumn{2}{c}{reduction}&&&&&&&\\
\hline
\end{tabular}
\end{table}