\begin{table}%t16
\caption{Fourier parameters of the light curves and corresponding estimate of the
star metallicity, absolute magnitude, intrinsic $(B-V)_0$ colour,  and effective temperature.
 \label{tab16}}
%\centerline
{\begin{tabular}{ccccccccccc}
\hline
\hline
\multicolumn{1}{c}{Star}&
\multicolumn{1}{c}{$P$}&
\multicolumn{1}{c}{$\langle B-V\rangle_{\rm int}$}&
\multicolumn{1}{c}{$A1$}&
\multicolumn{1}{c}{$A2$}&
\multicolumn{1}{c}{$A3$}&
\multicolumn{1}{c}{$A4$}&
\multicolumn{1}{c}{$A5$}&
\multicolumn{1}{c}{$A6$}&
\multicolumn{1}{c}{$A7$}&
\multicolumn{1}{c}{$A8$}\\
\hline
 7325 &0.48677& 0.410 & 0.34815  & 0.18973 &  0.13552  & 0.09432 &  0.05650 &  0.04252  & 0.01980  & 0.01321  \\
&&&&&&&&&\\ 
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{$\Phi_{21}$}&
\multicolumn{1}{c}{$\Phi_{31}$}&
\multicolumn{1}{c}{$\Phi_{41}$}&
\multicolumn{1}{c}{$\Phi_{51}$}&
\multicolumn{1}{c}{$\Phi_{61}$}&
\multicolumn{1}{c}{$\Phi_{71}$}&
\multicolumn{1}{c}{$\Phi_{81}$}\\
 &&&3.94169  & 1.90815  & 6.15817 &  4.23861 &  2.16828 &  0.40072 &  4.83247\\
&&&&&&&\\
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{df1}&
\multicolumn{1}{c}{df2}&
\multicolumn{1}{c}{df3}&
\multicolumn{1}{c}{df4}&
\multicolumn{1}{c}{df5}\\
 &&&  1.414 & 0.909 & 0.352 & 1.388 & 2.824  \\
&&&&&&\\
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{df21}&
\multicolumn{1}{c}{df31}&
\multicolumn{1}{c}{df41}&
\multicolumn{1}{c}{df51}\\
 &&&0.661 & 0.757 & 0.894 & 0.501 &\\
&&&&&&&\\
\multicolumn{1}{c}{[Fe/H]}&
\multicolumn{1}{c}{$M_V$}& 
\multicolumn{1}{c}{$(B-V)_0$}&
\multicolumn{1}{c}{$ \log T_{\rm eff}(B-V)$}\\
\multicolumn{1}{c}{}&
\multicolumn{1}{c}{}\\
 $-$0.874 &  0.684 & 0.332 &3.817&&\\ 
\hline
\end{tabular}}
\par
\smallskip
Table~\ref{tab16} is presented in its entirety in the electronic edition
of the Journal. A portion is shown here for guidance regarding its form
and content.
\end{table}