\begin{table}%t3
\caption{Radio sources in the EGRET error box.}\label{tab3}
%\centering
\par
\begin{tabular}{llcccc}
\hline
\hline
 & Source                   & RA            & Dec          & Flux   & Search offset   \\
 &                          & (J2000)       & J(2000)      & mJy        & arcmin         \\
\hline
1  & NVSS J041511+365802   & 04 15 11.2     & +36 58 02.8    & 260.8     & 15.78            \\  
2  & NVSS J041406+361548  & 04 14 06.4    & +36 15 48.4     & 110.8    &  40.89            \\ 
3  & NVSS J041859+362402  & 04 18 59.3    &+36 24 02.3     & 420.5   & 41.26           \\
4  & NVSS J041455+360250  & 04 14 55.1    & +36 02 50.7    &103.7    & 47.73            \\
5  & NVSS J041445+360236    & 04 14 45.9    & +36 02 36.2    &127.8   &  48.59            \\
6  & NVSS J041642+355303     &04 16 42.8    & +35 53 03.1    & 111.8    &  55.29          \\
7  & NVSS J041533+353940   & 04 15 33.2     & +35 39 40.7     & 218.9    & 71.42          \\
8  & NVSS J041820+380148   & 04 18 20.9     & +38 01 48.6     & 7726   & 75.85               \\
9  & GB6J0418+3801         & 04 18 22.1      & +38 01 47.0     &5168     & 75.93           \\
10 & GB6J0417+3631         & 04 17 19.6      & +36 31 36.0     & 123.0       & 24.10          \\
11 & GB6J0418+3623       & 04 18 59.4   & +36 23 53.0     & 112.0       & 43.84           \\
\hline
\end{tabular}
\end{table}