\begin{table}%t1
\caption{Iron lines in the spectrum of HD~221170.}\label{tab1}
%\centering
\begin{tabular}{clrrrr}
  \hline \hline
  \multicolumn{1}{c}{$\lambda$ }             &
  \multicolumn{1}{c}{Ident.}                 &
  \multicolumn{1}{c}{Eq. width }             &
  \multicolumn{1}{c}{\lggf}                  &
  \multicolumn{1}{c}{$E_{{\rm low}}$}              &
  \multicolumn{1}{c}{\lgN}                   \\
  \multicolumn{1}{c}{(\AA) }                 &
  \multicolumn{1}{c}{ }                      &
  \multicolumn{1}{c}{(m\AA)}                 &
  \multicolumn{1}{c}{     }                  &
  \multicolumn{1}{c}{(eV)}                 &
  \multicolumn{1}{c}{{\scriptsize \lgN(H) = 12}}         \\
\hline
   4531.150 &   Fe~I  &  122.0 & $-$2.15 & 1.485  &  5.548  \\
   4547.850 &   Fe~I  &   48.0 & $-$1.01 & 3.546  &  5.478  \\
   4587.130 &   Fe~I  &   12.0 & $-$1.78 & 3.573  &  5.393  \\
   4602.000 &   Fe~I  &   60.0 & $-$3.15 & 1.608  &  5.340  \\
   4602.940 &   Fe~I  &  120.0 & $-$1.95 & 1.485  &  5.276  \\
   4619.290 &   Fe~I  &   30.0 & $-$1.12 & 3.602  &  5.280  \\
   4630.120 &   Fe~I  &   56.0 & $-$2.60 & 2.278  &  5.576  \\
   4632.910 &   Fe~I  &   78.0 & $-$2.91 & 1.608  &  5.449  \\
   4637.500 &   Fe~I  &   37.0 & $-$1.39 & 3.283  &  5.294  \\
   4638.010 &   Fe~I  &   38.0 & $-$1.12 & 3.602  &  5.444  \\
   4647.430 &   Fe~I  &   70.0 & $-$1.31 & 2.949  &  5.437  \\
   4668.130 &   Fe~I  &   58.0 & $-$1.29 & 3.266  &  5.572  \\
   4669.170 &   Fe~I  &   29.0 & $-$1.21 & 3.653  &  5.410  \\
   4678.850 &   Fe~I  &   60.0 &  $-$.66 & 3.602  &  5.412  \\
   4704.950 &   Fe~I  &   12.0 & $-$1.57 & 3.686  &  5.321  \\
   4707.270 &   Fe~I  &   71.0 & $-$1.08 & 3.241  &  5.589  \\
   4741.530 &   Fe~I  &   44.0 & $-$2.00 & 2.831  &  5.458  \\
   4786.810 &   Fe~I  &   45.0 & $-$1.61 & 3.017  &  5.316  \\
   4800.650 &   Fe~I  &   12.0 & $-$1.03 & 4.142  &  5.340  \\
   4807.710 &   Fe~I  &   11.0 & $-$2.20 & 3.368  &  5.506  \\
   4872.140 &   Fe~I  &  111.0 &  $-$.60 & 2.882  &  5.481  \\
   4885.430 &   Fe~I  &   22.0 & $-$1.09 & 3.881  &  5.390  \\
   4886.330 &   Fe~I  &   23.0 &  $-$.74 & 4.154  &  5.401  \\
   4890.750 &   Fe~I  &  123.0 &  $-$.39 & 2.875  &  5.511  \\
   4903.310 &   Fe~I  &   99.0 &  $-$.93 & 2.882  &  5.541  \\
   4909.380 &   Fe~I  &   15.0 & $-$1.27 & 3.928  &  5.414  \\
   4910.020 &   Fe~I  &   36.0 & $-$1.54 & 3.396  &  5.537  \\
   4917.230 &   Fe~I  &   12.0 & $-$1.18 & 4.191  &  5.531  \\
   4918.020 &   Fe~I  &    7.0 & $-$1.36 & 4.230  &  5.504  \\
   4924.770 &   Fe~I  &   78.0 & $-$2.22 & 2.278  &  5.572  \\
   4938.810 &   Fe~I  &   86.0 & $-$1.08 & 2.875  &  5.388  \\
   4950.100 &   Fe~I  &   28.0 & $-$1.67 & 3.417  &  5.522  \\
   4967.890 &   Fe~I  &   28.0 &  $-$.62 & 4.191  &  5.435  \\
   4969.920 &   Fe~I  &   20.0 &  $-$.71 & 4.217  &  5.359  \\
   4983.270 &   Fe~I  &   45.0 &  $-$.16 & 4.154  &  5.274  \\
   4983.870 &   Fe~I  &   60.0 &  $-$.07 & 4.103  &  5.408  \\
   4985.250 &   Fe~I  &   47.5 &  $-$.49 & 3.928  &  5.369  \\
   4985.550 &   Fe~I  &   70.0 & $-$1.51 & 2.865  &  5.460  \\
   4994.130 &   Fe~I  &  122.0 & $-$2.96 &  .915  &  5.406  \\
   5001.860 &   Fe~I  &   70.0 &  $-$.03 & 3.881  &  5.285  \\
   5005.710 &   Fe~I  &   66.0 &  $-$.18 & 3.883  &  5.355  \\
   5006.120 &   Fe~I  &  111.0 &  $-$.77 & 2.832  &  5.540  \\
   5014.940 &   Fe~I  &   58.0 &  $-$.25 & 3.943  &  5.343  \\
   5022.240 &   Fe~I  &   44.0 &  $-$.53 & 3.984  &  5.411  \\
   5044.210 &   Fe~I  &   34.0 & $-$2.15 & 2.851  &  5.406  \\
   5048.430 &   Fe~I  &   16.0 & $-$1.26 & 3.959  &  5.467  \\
   5049.820 &   Fe~I  &  117.0 & $-$1.42 & 2.278  &  5.556  \\
   5051.630 &   Fe~I  &  137.0 & $-$2.80 &  .915  &  5.564  \\
\hline
   5079.220 &   Fe~I  &   86.0 & $-$2.07 & 2.198  &  5.441  \\
   5083.340 &   Fe~I  &  118.0 & $-$2.96 &  .958  &  5.347  \\
   5090.770 &   Fe~I  &   29.0 &  $-$.40 & 4.256  &  5.309  \\
   5097.000 &   Fe~I  &   35.0 &  $-$.28 & 4.283  &  5.348  \\
   5123.720 &   Fe~I  &  120.0 & $-$3.07 & 1.011  &  5.559  \\
   5127.360 &   Fe~I  &  112.0 & $-$3.31 &  .915  &  5.487  \\
   5137.400 &   Fe~I  &   43.0 &  $-$.40 & 4.177  &  5.487  \\
   5141.740 &   Fe~I  &   62.0 & $-$2.15 & 2.424  &  5.349  \\
   5151.910 &   Fe~I  &  109.0 & $-$3.32 & 1.011  &  5.567  \\
   5162.290 &   Fe~I  &   65.5 &   .02 & 4.177  &  5.501  \\
   5166.280 &   Fe~I  &  130.0 & $-$4.20 &  .000  &  5.473  \\
   5194.940 &   Fe~I  &  122.0 & $-$2.09 & 1.557  &  5.352  \\
   5195.470 &   Fe~I  &   43.0 &  $-$.23 & 4.220  &  5.366  \\
   5196.080 &   Fe~I  &   22.0 &  $-$.70 & 4.256  &  5.433  \\
   5198.710 &   Fe~I  &   85.0 & $-$2.13 & 2.223  &  5.492  \\
   5215.180 &   Fe~I  &   68.0 &  $-$.93 & 3.266  &  5.320  \\
   5216.270 &   Fe~I  &  120.0 & $-$2.15 & 1.608  &  5.422  \\
   5217.390 &   Fe~I  &   63.0 & $-$1.10 & 3.211  &  5.325  \\
   5225.520 &   Fe~I  &   93.0 & $-$4.79 &  .110  &  5.439  \\
   5242.490 &   Fe~I  &   46.0 &  $-$.97 & 3.634  &  5.422  \\
   5247.050 &   Fe~I  &   84.0 & $-$4.95 &  .087  &  5.405  \\
   5250.210 &   Fe~I  &   83.0 & $-$4.94 &  .121  &  5.419  \\
   5250.650 &   Fe~I  &   89.0 & $-$2.05 & 2.198  &  5.438  \\
   5253.020 &   Fe~I  &    4.5 & $-$3.94 & 2.278  &  5.392  \\
   5253.460 &   Fe~I  &   32.0 & $-$1.67 & 3.283  &  5.410  \\
   5263.310 &   Fe~I  &   73.0 &  $-$.97 & 3.266  &  5.447  \\
   5281.790 &   Fe~I  &   90.0 &  $-$.83 & 3.038  &  5.359  \\
   5307.360 &   Fe~I  &   77.0 & $-$2.99 & 1.608  &  5.377  \\
   5322.040 &   Fe~I  &   28.0 & $-$3.03 & 2.278  &  5.402  \\
   5364.860 &   Fe~I  &   53.0 &   .22 & 4.445  &  5.371  \\
   5367.480 &   Fe~I  &   62.0 &   .35 & 4.415  &  5.382  \\
   5369.960 &   Fe~I  &   67.0 &   .35 & 4.371  &  5.414  \\
   5379.570 &   Fe~I  &   17.0 & $-$1.48 & 3.694  &  5.364  \\
   5389.480 &   Fe~I  &   26.0 &  $-$.41 & 4.415  &  5.426  \\
   5391.460 &   Fe~I  &   23.0 &  $-$.82 & 4.154  &  5.440  \\
   5393.170 &   Fe~I  &   88.0 &  $-$.71 & 3.241  &  5.431  \\
   5398.280 &   Fe~I  &   13.0 &  $-$.67 & 4.445  &  5.346  \\
   5400.500 &   Fe~I  &   38.0 &  $-$.16 & 4.371  &  5.373  \\
   5403.820 &   Fe~I  &   15.0 & $-$1.03 & 4.076  &  5.318  \\
   5410.910 &   Fe~I  &   54.0 &   .28 & 4.473  &  5.361  \\
   5415.190 &   Fe~I  &   70.0 &   .50 & 4.386  &  5.335  \\
   5436.590 &   Fe~I  &   20.0 & $-$3.24 & 2.278  &  5.410  \\
   5445.040 &   Fe~I  &   48.0 &  $-$.02 & 4.386  &  5.437  \\
   5462.950 &   Fe~I  &   29.0 &  $-$.23 & 4.473  &  5.387  \\
   5466.390 &   Fe~I  &   21.0 &  $-$.63 & 4.371  &  5.467  \\
   5473.900 &   Fe~I  &   21.0 &  $-$.76 & 4.154  &  5.322  \\
   5483.100 &   Fe~I  &    4.5 & $-$1.58 & 4.154  &  5.386  \\
   5497.520 &   Fe~I  &  134.0 & $-$2.85 & 1.011  &  5.483  \\
\hline
   5501.460 &   Fe~I  &  121.0 & $-$3.05 &  .958  &  5.349  \\
   5506.780 &   Fe~I  &  132.0 & $-$2.80 &  .990  &  5.363  \\
   5522.450 &   Fe~I  &    4.0 & $-$1.55 & 4.209  &  5.370  \\
   5554.880 &   Fe~I  &   20.0 &  $-$.44 & 4.548  &  5.463  \\
   5560.210 &   Fe~I  &    5.5 & $-$1.19 & 4.434  &  5.429  \\
   5565.700 &   Fe~I  &   19.0 &  $-$.28 & 4.607  &  5.343  \\
   5576.090 &   Fe~I  &   63.0 & $-$1.00 & 3.430  &  5.465  \\
   5618.630 &   Fe~I  &    6.5 & $-$1.38 & 4.209  &  5.415  \\
   5624.040 &   Fe~I  &    4.0 & $-$1.48 & 4.386  &  5.517  \\
   5633.980 &   Fe~I  &    9.0 &  $-$.27 & 4.991  &  5.418  \\
   5638.260 &   Fe~I  &   19.0 &  $-$.87 & 4.220  &  5.452  \\
   5653.890 &   Fe~I  &    2.0 & $-$1.64 & 4.386  &  5.369  \\
   5662.520 &   Fe~I  &   32.0 &  $-$.54 & 4.177  &  5.373  \\
   5686.520 &   Fe~I  &   15.0 &  $-$.63 & 4.548  &  5.488  \\
   5701.540 &   Fe~I  &   55.0 & $-$2.22 & 2.559  &  5.407  \\
   5717.840 &   Fe~I  &   11.0 & $-$1.13 & 4.284  &  5.509  \\
   5752.020 &   Fe~I  &    5.5 & $-$1.00 & 4.548  &  5.373  \\
   5753.120 &   Fe~I  &   21.5 &  $-$.76 & 4.260  &  5.454  \\
   5760.350 &   Fe~I  &    3.0 & $-$2.49 & 3.641  &  5.469  \\
   5775.080 &   Fe~I  &    9.0 & $-$1.20 & 4.220  &  5.396  \\
   5862.350 &   Fe~I  &   25.0 &  $-$.36 & 4.548  &  5.490  \\
   5883.810 &   Fe~I  &   17.0 & $-$1.36 & 3.959  &  5.541  \\
   5916.250 &   Fe~I  &   23.0 & $-$2.99 & 2.453  &  5.422  \\
   5930.170 &   Fe~I  &   26.0 &  $-$.23 & 4.652  &  5.508  \\
   5956.690 &   Fe~I  &   44.0 & $-$4.61 &  .859  &  5.358  \\
   5976.770 &   Fe~I  &   15.0 & $-$1.31 & 3.943  &  5.402  \\
   5984.810 &   Fe~I  &   19.0 &  $-$.34 & 4.733  &  5.536  \\
   6003.010 &   Fe~I  &   25.0 & $-$1.12 & 3.881  &  5.410  \\
   6007.960 &   Fe~I  &    9.2 &  $-$.66 & 4.652  &  5.390  \\
   6008.550 &   Fe~I  &   25.0 & $-$1.08 & 3.883  &  5.376  \\
   6012.210 &   Fe~I  &    5.0 & $-$4.04 & 2.223  &  5.429  \\
   6024.050 &   Fe~I  &   36.0 &  $-$.12 & 4.548  &  5.473  \\
   6027.050 &   Fe~I  &   15.0 & $-$1.21 & 4.076  &  5.467  \\
   6055.990 &   Fe~I  &   12.5 &  $-$.46 & 4.733  &  5.435  \\
   6065.480 &   Fe~I  &   90.0 & $-$1.53 & 2.608  &  5.355  \\
   6082.710 &   Fe~I  &   17.0 & $-$3.57 & 2.223  &  5.532  \\
   6136.990 &   Fe~I  &   40.0 & $-$2.95 & 2.198  &  5.371  \\
   6137.690 &   Fe~I  &  105.0 & $-$1.40 & 2.588  &  5.447  \\
   6151.620 &   Fe~I  &   22.0 & $-$3.30 & 2.176  &  5.330  \\
   6173.340 &   Fe~I  &   41.0 & $-$2.88 & 2.223  &  5.348  \\
   6180.200 &   Fe~I  &   18.0 & $-$2.78 & 2.727  &  5.412  \\
   6191.560 &   Fe~I  &  109.0 & $-$1.42 & 2.433  &  5.334  \\
   6200.310 &   Fe~I  &   35.0 & $-$2.44 & 2.608  &  5.299  \\
   6213.430 &   Fe~I  &   64.0 & $-$2.48 & 2.223  &  5.316  \\
   6219.280 &   Fe~I  &   75.0 & $-$2.43 & 2.198  &  5.412  \\
   6232.640 &   Fe~I  &   30.0 & $-$1.27 & 3.653  &  5.363  \\
   6240.650 &   Fe~I  &   26.0 & $-$3.23 & 2.223  &  5.409  \\
   6246.320 &   Fe~I  &   57.0 &  $-$.96 & 3.602  &  5.478  \\
\hline
   6252.550 &   Fe~I  &  100.0 & $-$1.69 & 2.404  &  5.386  \\
   6265.130 &   Fe~I  &   70.5 & $-$2.55 & 2.176  &  5.421  \\
   6270.220 &   Fe~I  &   20.0 & $-$2.46 & 2.858  &  5.306  \\
   6290.970 &   Fe~I  &    9.0 &  $-$.67 & 4.733  &  5.472  \\
   6297.790 &   Fe~I  &   51.0 & $-$2.74 & 2.223  &  5.360  \\
   6302.490 &   Fe~I  &   28.0 & $-$1.20 & 3.686  &  5.288  \\
   6311.500 &   Fe~I  &    6.0 & $-$3.23 & 2.831  &  5.455  \\
   6318.020 &   Fe~I  &   86.0 & $-$1.80 & 2.453  &  5.297  \\
   6322.690 &   Fe~I  &   44.0 & $-$2.43 & 2.588  &  5.411  \\
   6335.330 &   Fe~I  &   84.0 & $-$2.23 & 2.198  &  5.344  \\
   6336.820 &   Fe~I  &   42.0 & $-$1.05 & 3.686  &  5.406  \\
   6344.150 &   Fe~I  &   31.0 & $-$2.92 & 2.433  &  5.469  \\
   6355.030 &   Fe~I  &   32.0 & $-$2.37 & 2.845  &  5.467  \\
   6393.600 &   Fe~I  &  105.0 & $-$1.62 & 2.433  &  5.413  \\
   6400.000 &   Fe~I  &   81.0 &  $-$.52 & 3.602  &  5.429  \\
   6408.020 &   Fe~I  &   38.0 & $-$1.05 & 3.686  &  5.327  \\
   6411.650 &   Fe~I  &   62.0 &  $-$.82 & 3.653  &  5.471  \\
   6419.940 &   Fe~I  &   19.0 &  $-$.24 & 4.733  &  5.411  \\
   6421.350 &   Fe~I  &   91.0 & $-$2.03 & 2.278  &  5.381  \\
   6430.840 &   Fe~I  &  105.0 & $-$2.01 & 2.176  &  5.435  \\
   6475.630 &   Fe~I  &   21.5 & $-$2.94 & 2.559  &  5.426  \\
   6481.870 &   Fe~I  &   33.0 & $-$2.98 & 2.278  &  5.351  \\
   6494.980 &   Fe~I  &  132.0 & $-$1.27 & 2.404  &  5.477  \\
   6518.370 &   Fe~I  &   23.0 & $-$2.46 & 2.831  &  5.329  \\
   6546.240 &   Fe~I  &   92.0 & $-$1.54 & 2.758  &  5.523  \\
   6575.020 &   Fe~I  &   26.0 & $-$2.82 & 2.588  &  5.444  \\
   6581.210 &   Fe~I  &   10.0 & $-$4.68 & 1.485  &  5.383  \\
   6592.910 &   Fe~I  &   90.0 & $-$1.60 & 2.727  &  5.498  \\
   6593.870 &   Fe~I  &   51.0 & $-$2.42 & 2.433  &  5.290  \\
   6609.110 &   Fe~I  &   28.0 & $-$2.69 & 2.559  &  5.315  \\
   6750.150 &   Fe~I  &   48.0 & $-$2.62 & 2.424  &  5.418  \\
   6828.590 &   Fe~I  &    7.0 &  $-$.92 & 4.638  &  5.453  \\
   6839.830 &   Fe~I  &    9.5 & $-$3.42 & 2.559  &  5.471  \\
   6843.650 &   Fe~I  &    8.0 &  $-$.93 & 4.548  &  5.412  \\
   6855.160 &   Fe~I  &   16.0 &  $-$.49 & 4.558  &  5.326  \\
   6945.200 &   Fe~I  &   49.0 & $-$2.48 & 2.424  &  5.278  \\
   6978.850 &   Fe~I  &   53.0 & $-$2.50 & 2.484  &  5.434  \\
   7016.060 &   Fe~I  &   17.0 & $-$3.21 & 2.424  &  5.363  \\
   7022.950 &   Fe~I  &   13.0 & $-$1.25 & 4.191  &  5.510  \\
   7038.220 &   Fe~I  &   10.0 & $-$1.30 & 4.217  &  5.466  \\
   7086.720 &   Fe~I  &    2.5 & $-$2.68 & 3.602  &  5.425  \\
   7090.380 &   Fe~I  &   13.5 & $-$1.21 & 4.230  &  5.535  \\
   7130.920 &   Fe~I  &   28.0 &  $-$.79 & 4.217  &  5.492  \\
   7151.470 &   Fe~I  &    7.5 & $-$3.68 & 2.484  &  5.503  \\
   7164.440 &   Fe~I  &   41.0 &  $-$.53 & 4.191  &  5.448  \\
   7219.680 &   Fe~I  &    6.0 & $-$1.69 & 4.076  &  5.426  \\
   7445.750 &   Fe~I  &   47.0 &  $-$.24 & 4.256  &  5.325  \\
   7461.520 &   Fe~I  &    8.0 & $-$3.55 & 2.559  &  5.478  \\
\hline
  7491.650 &   Fe~I  &   12.0 & $-$1.01 & 4.301  &  5.345  \\
   7511.020 &   Fe~I  &   79.0 &   .11 & 4.177  &  5.398  \\
   7568.890 &   Fe~I  &   25.0 &  $-$.68 & 4.283  &  5.377  \\
   7583.790 &   Fe~I  &   47.0 & $-$1.89 & 3.017  &  5.374  \\
   7710.360 &   Fe~I  &   14.0 & $-$1.05 & 4.220  &  5.348  \\
   7723.200 &   Fe~I  &   14.0 & $-$3.62 & 2.278  &  5.435  \\
   7748.270 &   Fe~I  &   59.0 & $-$1.76 & 2.949  &  5.329  \\
   7832.190 &   Fe~I  &   52.0 &   .02 & 4.434  &  5.348  \\
   7912.860 &   Fe~I  &   41.0 & $-$4.85 &  .859  &  5.382  \\
   7945.840 &   Fe~I  &   61.0 &   .12 & 4.386  &  5.324  \\
   7998.940 &   Fe~I  &   52.0 &  $-$.27 & 4.371  &  5.543  \\
   8028.310 &   Fe~I  &   11.0 &  $-$.94 & 4.473  &  5.413  \\
   8047.620 &   Fe~I  &   50.0 & $-$4.70 &  .859  &  5.350  \\
   8085.180 &   Fe~I  &   42.0 &  $-$.24 & 4.445  &  5.435  \\
   8387.770 &   Fe~I  &  152.0 & $-$1.49 & 2.176  &  5.358  \\
   8439.560 &   Fe~I  &   13.0 &  $-$.70 & 4.548  &  5.328  \\
   8468.400 &   Fe~I  &  111.0 & $-$2.07 & 2.223  &  5.388  \\
   8515.110 &   Fe~I  &   53.0 & $-$1.92 & 3.017  &  5.425  \\
   8582.260 &   Fe~I  &   34.0 & $-$2.13 & 2.990  &  5.287  \\
   8611.800 &   Fe~I  &   68.0 & $-$1.90 & 2.845  &  5.400  \\
   8621.600 &   Fe~I  &   36.0 & $-$2.32 & 2.949  &  5.460  \\
   8674.740 &   Fe~I  &   81.0 & $-$1.85 & 2.831  &  5.510  \\
   8688.620 &   Fe~I  &  179.0 & $-$1.21 & 2.176  &  5.395  \\
   8757.180 &   Fe~I  &   54.0 & $-$2.03 & 2.845  &  5.309  \\
   8838.420 &   Fe~I  &   61.0 & $-$2.05 & 2.858  &  5.440  \\
   8866.920 &   Fe~I  &   44.0 &  $-$.06 & 4.548  &  5.362  \\
   8868.430 &   Fe~I  &   18.0 & $-$2.65 & 3.017  &  5.471  \\
   8999.560 &   Fe~I  &  110.0 & $-$1.30 & 2.831  &  5.366  \\
   9088.310 &   Fe~I  &   85.0 & $-$1.89 & 2.845  &  5.584  \\
            &         &        &       &        &         \\
   4508.290 &   Fe~II &   74.5 & $-$2.21 & 2.855  &  5.202  \\
   4515.340 &   Fe~II &   70.0 & $-$2.48 & 2.844  &  5.373  \\
   4520.220 &   Fe~II &   65.0 & $-$2.60 & 2.806  &  5.325  \\
   4541.520 &   Fe~II &   54.7 & $-$3.05 & 2.855  &  5.609  \\
   4555.890 &   Fe~II &   75.0 & $-$2.29 & 2.828  &  5.258  \\
   4576.340 &   Fe~II &   48.0 & $-$3.04 & 2.844  &  5.445  \\
   4582.840 &   Fe~II &   30.7 & $-$3.10 & 2.844  &  5.142  \\
   4620.520 &   Fe~II &   30.2 & $-$3.28 & 2.828  &  5.289  \\
   4666.760 &   Fe~II &   32.0 & $-$3.33 & 2.828  &  5.383  \\
   4731.450 &   Fe~II &   44.1 & $-$3.36 & 2.891  &  5.732  \\
   4993.360 &   Fe~II &   18.0 & $-$3.65 & 2.806  &  5.293  \\
   5100.660 &   Fe~II &    8.4 & $-$4.37 & 2.806  &  5.620  \\
   5197.580 &   Fe~II &   68.9 & $-$2.10 & 3.230  &  5.338  \\
   5234.630 &   Fe~II &   71.1 & $-$2.05 & 3.221  &  5.316  \\
   5256.940 &   Fe~II &    9.0 & $-$4.25 & 2.891  &  5.620  \\
   5264.810 &   Fe~II &   23.3 & $-$3.19 & 3.230  &  5.478  \\
   5276.000 &   Fe~II &   82.0 & $-$1.94 & 3.199  &  5.399  \\
\hline
   5284.110 &   Fe~II &   40.0 & $-$3.19 & 2.891  &  5.428  \\
   5325.550 &   Fe~II &   22.0 & $-$2.60 & 3.221  &  4.842  \\
   5362.870 &   Fe~II &   55.0 & $-$2.74 & 3.199  &  5.646  \\
   5414.070 &   Fe~II &    9.0 & $-$3.79 & 3.221  &  5.555  \\
   5425.260 &   Fe~II &   19.6 & $-$3.36 & 3.199  &  5.504  \\
   5534.850 &   Fe~II &   34.0 & $-$2.93 & 3.245  &  5.470  \\
   5991.380 &   Fe~II &   13.0 & $-$3.56 & 3.153  &  5.406  \\
   6084.110 &   Fe~II &    7.6 & $-$3.81 & 3.199  &  5.446  \\
   6247.560 &   Fe~II &   27.0 & $-$2.33 & 3.891  &  5.473  \\
   6432.680 &   Fe~II &   18.0 & $-$3.71 & 2.891  &  5.383  \\
   6456.380 &   Fe~II &   40.0 & $-$2.08 & 3.903  &  5.504  \\
   6516.080 &   Fe~II &   31.3 & $-$3.45 & 2.891  &  5.441  \\
   7711.720 &   Fe~II &   14.0 & $-$2.54 & 3.903  &  5.253  \\
\hline
\end{tabular}
\end{table}