\begin{table}%T1
\caption{Weighted oscillator strength $gf$(AS), 
$17$ configurations. Comparison with 
$gf$(AS4),  including  $n=4$  correlation configurations; $gf$(AS5),  
including $n=5$ correlation 
configurations. The $gf$'s were   
calculated using  AUTOSTRUCTURE.
}
\label{auto-comp}
%\centering
\par
  \begin{tabular}{llll}
\hline\hline\noalign{\smallskip}
$i-j$  & $gf$(AS) & $gf$(AS)/$gf$(AS4) & $gf$(AS)/$gf$(AS5) \\\hline
% 1--14 in F2 and F3
1--13 & 0.25          & 1.01 & 1.02   \\
1--15 & 0.41          & 0.98  & 0.98\\
1--22 & $1.3\times 10^{-2}$ & 1.07  & 1.07 \\
1--25 & $2.3\times 10^{-2}$ & 1.13  & 1.14\\
1--36 & $5.0\times 10^{-3}$ & 0.90  & 0.89\\
1--42 & $2.0\times 10^{-4}$ & 0.86  & 0.85 \\
1--46 & $1.7\times 10^{-2}$ & 0.94  & 0.93 \\
1--50 & $2.7\times 10^{-2}$ & 0.98  & 0.90 \\
1--52 &  0.13	  & 1.00  & 0.97 \\
1--62 & $3.1\times 10^{-4}$ & 1.16  & 1.47 \\
1--70 & $2.3\times 10^{-3}$ & 0.97  & 0.93 \\
\par
%1--76 in F2 and F3 
1--75 & $3.0\times 10^{-4}$ & 1.04   & 1.49 \\
\par
%1--86 in F2 and F3 
1--87 & $6.3\times 10^{-5}$ & 0.98   & 0.94 \\
1--97 & $4.6\times 10^{-3}$ & 0.96   & 0.91 \\
\hline
\end{tabular}
\end{table}