\begin{table}%[htbp]%t2
\label{tab:inteobs}
%\begin{center}
\par
  \caption{Summary of the two \inte\ observations where a significant 
detection for \src\ has been obtained. IBIS/ISGRI count rates are
in the 20--40~keV energy band. }
    \begin{tabular}[l]{lll}
\hline\hline
\inte\ & Start time      &  ISGRI rate \\
obs.   &   (UT)          & (s$^{-1}$) \\
\hline
004700970010 & 05 Mar. 2003  08:15:35  & $1.78 \pm{0.45}$   \\
005000770010 & 14 Mar. 2003  00:30:54  & $1.60 \pm{0.43}$  \\
\hline
\end{tabular}
%\end{center}
\par
\end{table}