\begin{table}%t3
\caption{Average energy per particle dissipated by jets of different power~$L_{\rm j}$ in the three clusters characterized by $T_{\rm ew}$~= 0.5, 1, 2~kev. Reported are the average energy per particle dissipated inside the entire domain (first value) and inside the cluster core $R < r_{\rm s}$ (second value) at the end of the simulations.}\label{table:tdiss}
%\centering
\par
\begin{tabular}{cccc}  
\hline \hline
$L_{\rm j}$ (erg s$^{-1}$)  & $T_{\rm ew}=$ 0.5 keV & $T_{\rm ew}=$ 1 keV & $T_{\rm ew}=$ 2 keV \\
\hline
$10^{46}$ &  1--3.2  keV & 0.5--2 keV & 0.2--1 keV\\
$5\times10^{46}$ & 4.1--9.7 keV & 2.1--5.6 keV & 0.9--3.1 keV \\
\hline
\end{tabular}
\end{table}