\begin{table}%t2
\caption{Resultant images.\label{reduced}} 
%\centerline
{\begin{tabular}{l c r c c} 
\hline \hline
Band & $T$ & Size & $M_{\rm lim}$ & Seeing \\
(1) & (2) & \multicolumn{1}{c}{(3)} & (4) & (5) \\ \hline
\nbo         & 4.0 & 46.6 & 26.5 & 0.75\arcsec\\
$B$          & 0.5 & 46.6 & 27.5 & 0.70\arcsec\\
$R$          & 0.5 & 46.6 & 26.4 & 0.85\arcsec\\
$I$          & 2.0 & 46.6 & 26.8 & 0.65\arcsec\\
$J_{\rm s}$        & 1.0 &  7.5 & 24.8 & 0.45\arcsec\\
$H$          & 0.7 &  7.5 & 23.8 & 0.70\arcsec\\
$K_{\rm s}$        & 1.6 & 12.5 & 23.0 & 0.45\arcsec\\
\nbir        & 4.8 & 12.5 & 22.8 & 0.50\arcsec\\
\hline  
\end{tabular}}
\par
\smallskip
\noindent Notes: (1) Broad band or narrow band (see
Table~\ref{obs_table} for specifications); (2) total exposure time
(hours); (3) field size in square arcminute; (4) 3$\sigma$ limiting Vega
magnitude in 1\arcsec\ aperture as measured on central square
arcminute of image; (5) seeing on resultant image.
%%\end{center}
\par
\end{table}