\begin{table}%t3
%\centering
 \caption{The wavelength dependence of scattered radiation from DES.}
 \label{t3}
\begin{tabular}{@{}cccc}
  \hline\hline
  $Cut$$^{a}$ & $n^{b}$ & $P_{H}$/$P_{J}$ & $P_{K}$/$P_{H}$  \\
  \hline
    1 & 11 & 0.82~$\pm$~0.10 & 0.77~$\pm$~0.14 \\
    2 & 15 & 0.70~$\pm$~0.11 & 0.84~$\pm$~0.12 \\
    3 & 21 & 0.83~$\pm$~0.11 & 0.72~$\pm$~0.16 \\
  \hline
\end{tabular}
\par
\begin{list}{} 
 \item $^a$ Three cuts were taken for \mbox{DES-S87}E: cut~1
is to the northwest of the source; cut~2 is to the east of the
source; cut~3 is along the blueshifted outflow axis.\\
 \item $^b$ The number of pixels covered by each cut.
\end{list}
\end{table}