\begin{table}%Tb.1
\caption{Basic information on the sources excluded from the
sample(s) since their "Illumination Factor'' is less than 0.8.}\label{tB.1}
%\centerline
{
\begin{tabular}{llrl}
\hline
\hline
Obs. ID    & RA; Dec (J2000)      & OffAxis  & Illum. \\
           &                      & arcmin    &    \\
(1)                  & (2)        & (3)       & (4) \\
\hline
 0111000101 & 00 18 41.6   +16 20 33.4  &   5.94     & 0.69 \\
 0001930101 & 00 26 24.9   +10 31 23.7  &  10.77     & 0.68 \\
 0112320101 & 00 30 08.3   +05 03 40.9  &  12.83     & 0.70 \\
 0065770101 & 00 32 41.0   +39 40 08.2  &   5.70     & 0.42 \\
 0112600601 & 01 26 40.3   +19 12 13.0  &  12.36     & 0.60 \\
 0112630201 & 01 34 03.1 $-$40 02 22.8  &  12.38     & 0.68 \\
 0112371501 & 02 18 21.9 $-$04 34 51.2  &   7.80     & 0.48 \\
 0111110501 & 02 22 49.4 $-$05 14 53.0  &   5.58     & 0.27 \\
 0098810101 & 02 36 30.3 $-$52 27 04.3  &   7.66     & 0.77 \\
 0098810101 & 02 37 02.1 $-$52 23 48.0  &   8.53     & 0.62 \\
 0122520201 & 03 13 14.6 $-$76 55 55.4  &   5.88     & 0.71 \\
 0110970401 & 03 13 34.3 $-$55 26 43.6  &   7.85     & 0.76 \\
 0111970301 & 04 09 02.1 $-$71 07 54.6  &   9.83     & 0.63 \\
 0085640101 & 05 21 00.2 $-$25 28 52.5  &   7.00     & 0.49 \\
 0050150101 & 05 25 57.1 $-$33 44 35.7  &  10.72     & 0.74 \\
 0110930101 & 06 17 56.8   +78 16 05.3  &   5.81     & 0.66 \\
 0103860101 & 06 24 46.8 $-$64 33 46.0  &  10.80     & 0.78 \\
 0112980201 & 06 57 26.2 $-$55 49 53.9  &  10.49     & 0.78 \\
 0025540301 & 08 38 27.2   +25 50 53.7  &   5.75     & 0.65 \\
 0025540301 & 08 38 52.5   +25 37 25.3  &  10.27     & 0.58 \\
 0110660201 & 09 07 51.1   +62 01 58.3  &  12.77     & 0.65 \\
 0084230601 & 09 16 45.2   +51 41 45.0  &  10.53     & 0.57 \\
 0110930201 & 10 00 56.7   +55 41 01.2  &   8.50     & 0.69 \\
 0101040301 & 10 23 13.3   +19 56 50.5  &   6.43     & 0.62 \\
 0055990201 & 10 50 29.0   +33 00 42.8  &   7.63     & 0.70 \\
 0110660401 & 11 26 11.9   +42 52 45.9  &   2.09     & 0.78$^{a}$ \\
 0124110101 & 12 21 34.3   +75 09 18.1  &   9.34     & 0.60 \\
 0124110101 & 12 22 07.3   +75 26 20.7  &   7.88     & 0.53 \\
 0092360601 & 12 52 14.1 $-$83 46 42.6  &   9.48     & 0.66 \\
 0002940101 & 13 06 32.8 $-$23 31 13.1  &  12.05     & 0.62 \\
 0111160101 & 13 34 16.9   +50 23 09.6  &   7.78     & 0.64 \\
 0111160101 & 13 35 09.6   +50 39 17.8  &  11.58     & 0.73 \\
 0111570201 & 13 35 18.7 $-$34 21 45.5  &   8.30     & 0.62 \\
 0112250301 & 14 15 39.9   +11 24 04.4  &   5.69     & 0.37 \\
 0109960101 & 14 18 42.7   +25 07 09.5  &   9.90     & 0.79 \\
 0070740301 & 15 03 39.6   +10 16 04.9  &  11.46     & 0.66 \\
 0018741001 & 15 18 59.7   +06 18 39.4  &   5.57     & 0.73 \\
 0061940301 & 16 32 39.0   +78 11 54.3  &   5.48     & 0.56 \\
 0102040101 & 17 22 54.3   +34 27 25.3  &  10.89     & 0.58 \\
 0061940201 & 21 37 47.7 $-$42 26 14.5  &  10.55     & 0.68 \\
 0008830101 & 21 39 57.9 $-$23 45 35.1  &   7.27     & 0.76 \\
 0111790101 & 22 36 06.1 $-$26 08 04.6  &   6.80     & 0.55 \\
 0109070401 & 22 47 48.1 $-$51 10 18.1  &   8.38     & 0.73 \\
 0025541001 & 23 04 43.5   +12 12 10.2  &   8.04     & 0.53 \\
 0123900101 & 23 14 32.2 $-$42 33 01.5  &  12.11     & 0.72 \\
\hline
\end{tabular}}
\par
\medskip
Columns are as follows:
(1) XMM-Newton Observation number; (2)~Right Ascension and Declination
(J2000) of the source (X-ray position); (3) Angular distance (in
arcmin) between the source and the MOS2 image center; (4)
"Illumination factor''.
\par
NOTE -- $^{a}$Although this source is well contained inside the
MOS2 central CCD it fall above a bad column; for this reason its
"Illumination factor'' is below 0.8.
\end{table}