\begin{table}%t2
\caption{\label{table2}Estimated photometric errors.}
%\centering
\par
\begin{tabular}{l c c}
\hline\hline
  Bin            & Error in $H$ & Error in $J$\\
\hline
mag.~$\leq$ 22      & 0.05  & 0.05\\
22~$<$ mag.~$\leq$ 23 & 0.10  & 0.09\\
mag.~$>$ 23         & 0.12  & 0.21\\
\hline
\end{tabular}
\end{table}