\begin{table}%T2
\par
\caption{\label{tab2}Periods and  relative rates of period change  ($\ell= 1$ modes) 
for selected models with~$M_*= 0.60~M_{\odot}$ and 
$M_{\rm He}= 8 \times  10^{-3}~M_*$.}
{{%\centerline
{
\begin{tabular}{c|cc|cc|cc|cc|cc|cc|cc}
\hline
\hline
\multicolumn{1}{c|}{} & 
\multicolumn{2}{c|}{$T_{\rm eff}=27~925$  K} & 
\multicolumn{2}{c|}{26~938  K} &
\multicolumn{2}{c|}{26~004  K} & 
\multicolumn{2}{c|}{24~950  K} &
\multicolumn{2}{c|}{23~966  K} & 
\multicolumn{2}{c|}{23~049  K} &
\multicolumn{2}{c}{22~064  K}\\
\hline
$k$ &~$P$ [s] &~$\dot{P}/P$ &~$P$ [s] &~$\dot{P}/P$ &~$P$ [s] &~$\dot{P}/P$ 
&~$P$ [s] &~$\dot{P}/P$ &~$P$ [s] &~$\dot{P}/P$ &~$P$ [s] &~$\dot{P}/P$ &~$P$ [s] &~$\dot{P}/P$\\
 1&        123.16&          4.95&        126.25&          4.05&        129.36&          3.30&        133.16&          2.56&        137.01&          2.00&        140.92&          1.59&        145.61&          1.26\\
 2&        159.46&          4.93&        163.45&          4.05&        167.49&          3.30&        172.39&          2.55&        177.33&          1.98&        182.30&          1.55&        188.12&          1.19\\
 3&        197.64&          3.55&        201.20&          2.95&        204.81&          2.42&        209.21&          1.89&        213.70&          1.49&        218.20&          1.17&        223.44&          0.89\\
 4&        235.69&          5.07&        241.75&          4.17&        247.89&          3.37&        255.26&          2.58&        262.56&          1.95&        269.69&          1.47&        277.76&          1.10\\
 5&        271.80&          3.81&        277.04&          3.15&        282.33&          2.56&        288.72&          1.99&        295.23&          1.57&        301.91&          1.26&        310.08&          1.04\\
 6&        307.31&          5.00&        315.09&          4.10&        322.93&          3.30&        332.32&          2.52&        341.62&          1.91&        350.68&          1.44&        360.76&          1.04\\
 7&        347.63&          3.24&        353.24&          2.60&        358.75&          2.08&        365.30&          1.61&        371.90&          1.26&        378.60&          1.01&        386.64&          0.82\\
 8&        394.66&          4.56&        403.12&          3.28&        410.34&          2.24&        417.58&          1.44&        423.93&          1.03&        430.12&          0.82&        437.94&          0.72\\
 9&        419.51&          2.96&        426.33&          2.81&        434.42&          2.71&        445.83&          2.42&        458.55&          2.02&        471.95&          1.63&        487.89&          1.25\\
10&        460.04&          3.62&        468.28&          2.90&        476.48&          2.37&        486.64&          1.90&        497.22&          1.52&        507.85&          1.17&        519.73&          0.86\\
11&        486.33&          4.01&        496.93&          3.68&        508.45&          3.16&        522.89&          2.49&        537.17&          1.84&        550.13&          1.26&        563.16&          0.86\\
12&        533.62&          3.99&        544.07&          3.11&        553.83&          2.32&        564.13&          1.52&        572.91&          1.04&        581.80&          0.93&        595.34&          1.00\\
13&        569.46&          4.28&        581.40&          3.30&        592.27&          2.41&        604.09&          1.71&        615.98&          1.41&        628.86&          1.20&        645.01&          0.99\\
14&        608.54&          3.52&        618.12&          2.40&        627.25&          2.06&        640.25&          1.99&        655.81&          1.75&        672.03&          1.35&        689.79&          0.98\\
15&        632.97&          3.30&        644.83&          3.29&        658.72&          3.01&        676.93&          2.44&        695.17&          1.81&        711.66&          1.23&        729.36&          1.01\\
16&        673.56&          3.12&        685.30&          2.98&        698.24&          2.56&        713.68&          1.88&        727.50&          1.26&        740.44&          1.04&        759.67&          1.13\\
17&        715.79&          4.68&        732.38&          3.66&        747.30&          2.54&        761.23&          1.44&        773.06&          1.13&        787.15&          1.10&        807.43&          1.10\\
18&        752.71&          4.03&        767.22&          2.98&        780.23&          2.22&        796.58&          1.98&        815.98&          1.76&        836.16&          1.34&        858.69&          1.09\\
19&        787.73&          4.01&        801.97&          2.74&        815.41&          2.34&        834.17&          2.15&        854.89&          1.72&        874.52&          1.21&        897.69&          1.17\\
20&        818.66&          2.76&        831.58&          2.88&        848.17&          2.87&        870.67&          2.33&        892.11&          1.59&        910.63&          1.12&        935.40&          1.22\\
21&        856.30&          3.36&        872.61&          3.27&        890.45&          2.72&        910.49&          1.84&        927.66&          1.28&        946.28&          1.23&        974.56&          1.29\\
22&        900.31&          4.22&        919.46&          3.38&        936.62&          2.32&        953.00&          1.44&        969.97&          1.37&        991.07&          1.25&       1018.92&          1.22\\
23&        935.04&          4.75&        956.72&          3.60&        975.60&          2.45&        996.68&          1.98&       1020.37&          1.67&       1042.83&          1.13&       1068.49&          1.18\\
24&        970.30&          3.70&        986.29&          2.48&       1002.22&          2.41&       1027.69&          2.41&       1056.14&          1.89&       1082.72&          1.32&       1115.12&          1.33\\
\hline
\end{tabular}}}}
\smallskip
Note -- All~$\dot{P}/P$ values are in units of~$10^{-16}$ s$^{-1}$.
\end{table}