\begin{table}%t2
%\centering
\par
%\renewcommand{\arraystretch}{1.2}
\caption{ \label{tab:Results} Measured values of Fourier transform zeros and calculated parameters $v~\sin{i}$, $v$ and $i$. For $v~\sin{i}$ formal and estimated systematic errors are given. For $1\sigma$ and $2\sigma$ confidence levels in $v$ and $i$, signal-to-noise ratios of the broadening function of 1000 and 500 are adopted, respectively.}
\begin{tabular}{cc}
\hline\hline
\noalign{\smallskip}
    Parameter & Value\\ 
\noalign{\smallskip}
\hline
\noalign{\smallskip}
    $q_1$ & $(2.91 \pm 0.03)\times10^{-3}$~s~km$^{-1}$\\
    $q_2$ & $(5.16 \pm 0.08)\times10^{-3}$~s~km$^{-1}$\\
    $\frac{q_2}{q_1}$ & $1.77 \pm 0.03$\\  
\noalign{\smallskip}
\hline
\noalign{\smallskip}
    $v~\sin{i}$   & $(227 \pm 2 \pm 11)$~km~s$^{-1}$\\
    $v$ & $<$245~km~s$^{-1} \quad (1\sigma)$\\
    & $<$305~km~s$^{-1} \quad (2\sigma)$\\
\noalign{\smallskip}
    $i$ & $>$68$^{\circ} \quad (1\sigma)$\\
    & $>$45$^{\circ}     \quad (2\sigma)$\\
%\noalign{\smallskip}
\hline
\end{tabular}
\end{table}