\begin{table}%t1
 \caption{ISOCAM Deep Lockman Hole observation parameters.}
\label{tab:obsparam}
%\centering
\par
\begin{tabular}{l c}
   \hline
   \hline
   Parameter      &  $LW3$  \\
   \hline
   Band effective wavelength             & 14.3 $\mu$m \\
   Band width                            &  6   $\mu$m \\
   Detector gain                         &  2    \\
   Integration time                      &  5 s  \\
   Pixel field of view                   &  6$''$  \\
   Nr. of horizontal and vertical steps  &  11 $\times$ 4  \\
   Step sizes                            &  54$''$, 168$''$ \\
   Nr. of raster maps                    &  8    \\
   Total area covered                    &  0.14 deg$^{2}$ \\
   \hline
\end{tabular}
\end{table}