\begin{table}%t5
\caption{Frequencies, amplitudes and phases derived from the Fourier analysis of the 2000 data set, 
including the bi-site Mt.~Stromlo/SAAO observations in April and May~2000. The uncertainty of the frequency is less than 0.006~d$^{-1}$. Phase is relative to $T_{0}$~= 1646.3040  ($\Delta {\rm HJD}$).}\label{f00}
%\centering
\par
\begin{tabular}{llcccc}
\hline\hline
 {\bf year
 }  &Frequency & Period &Amplitude & Phase &  Conf.\\
 {\bf 2000} &(d$^{-1}$)  & (min) &  (km~s$^{-1}$)  & & $>$$\%$ \\
\hline
& $f_{1}$:~~35.609 &40.439& 0.328  & 0.596  & 99.9\\
& $f_{2}$:~~33.283 &43.265& 0.258  & 0.492  & 99.9\\
& $f_{3}$:~~31.012 &46.434& 0.177  & 0.393  & 99.9\\
& $f_{4}$:~~28.521 &50.489& 0.165  & 0.281  & 99.9\\
& $f_{5}$:~~32.375 &44.479& 0.113  & 0.996  & 99.9\\
\hline
\end{tabular}
%\vspace*{-4mm}
\end{table}