\begin{table}%[htb]%t4
%\centering
\par
\caption{Total flux (FIR) and temperature ($T$) of the warm (w) and cold (c) components needed to fit the spectra with two independent gray bodies.}
\label{tab_dust_fits}
\begin{tabular}{lllll}
\hline\hline
%\noalign{\smallskip}
Fuente & FIR$\rm _w$ & FIR$\rm _c$ & $T{\rm _c}$ & $T{\rm _w}$  \\
       & W~cm$^{-2}$ & W~cm$^{-2}$ & K & K \\
       &$\times 10^{-15}$ & $\times 10^{-15}$ &    \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
M--0.96+0.13 & 2.4 & 0.5  & 14--15 & 28--31  \\
M--0.55--0.05 &10.6 & 1.7  & 15--16 & 30--33  \\
M--0.50--0.03 & 9.7 & 1.0  & 16--18 & 33--34  \\
M--0.42+0.01 & 8.6 & 1.2  & 16--17 & 29--32  \\
M--0.32--0.19 & 7.3 & 0.4  & 15--16 & 30--39  \\
M--0.15--0.07 & ... & ...  & ...   & ...    \\
M+0.16--0.10 & 7.8 & 2.1  & 16--17 & 30--33  \\
M+0.21--0.12 &12.1 & 1.4  & 16--17 & 36--42  \\
M+0.24+0.02 &12.9 & 3.2  & 16--17 & 29--31  \\
M+0.35--0.06 &13.4 & 1.1  & 16--20 & 33--39  \\
M+0.48+0.03 & 8.0 & 1.8  & 14--15 & 25--27  \\
M+0.58--0.13 & 6.6 & 0.6  & 14--16 & 26--28  \\
M+0.76--0.05 & 7.0 & 1.1  & 14--16 & 23--25  \\
M+0.83--0.10 & 5.5 & 0.8  & 15--16 & 25--28  \\
M+0.94--0.36 & ... & ...  &...    &  ...   \\
M+1.56--0.30 & 0.8 & 0.7  & 16--18 & 26--29  \\
M+2.99--0.06 & 0.7 & 1.0  & 16--19 & 27--31  \\
M+3.06+0.34 & 0.3 & 0.8  & 17--20 & 31--36  \\
%\noalign{\smallskip}
\hline
\end{tabular}
\end{table}