\begin{table}%T1
%\centering
\par
 \caption{Lockman Hole observation parameters.}
\label{tab:obsparam}
\begin{tabular}{l c}
   \hline\hline
   \noalign{\smallskip}
   Parameter      &  Value  \\
   \noalign{\smallskip}
   \hline
   \noalign{\smallskip}
   Band effective wavelength             & 14.3~$\mu$m \\
   Band width                            &  6~$\mu$m \\
   Detector gain                         &  2 e$^-$/ADU \\
   Integration time                      &  5.04 s  \\
   No. of exposures per pointing         & 11   \\
   No. of stabilisation exposures        &115   \\
   Pixel field of view                   &  6\asec  \\
   No. of horizontal and vertical steps  &  24 $\times$ 8  \\
   Step sizes                            &  54\asec, 168\asec \\
   No. of raster maps                    &  4  \\
   Total area covered                    &  0.55 deg$^{2}$ \\
 \hline
\end{tabular}
\end{table}