\begin{table} %t1
%\centering
\par
\caption{List of the selected 24 events.
Peak flux means the fitted non-thermal flux at 35 keV at peak time in
photons~s$^{-1}$~cm$^{-2}$~keV$^{-1}$.
The peak time given reflects the time of maximum flux \emph{after\/}
the fitting selection, and may therefore not coincide with the peak of a
light curve at 35 keV.}
\begin{tabular}{cccccc}
\hline\hline
Event    & Event date  & Peak & Peak & Peak     & Number \\ 
No.      &             & time & flux & $\gamma$ & of fittings \\
\hline
1& 20 Feb. 2002 & 09:54:04 & 0.315 & 6.8 & 54  \\  
2& 20 Feb. 2002 & 16:22:58 & 0.168 & 3.8 & 11  \\  
3& 20 Feb. 2002 & 21:06:05 & 2.388 & 4.1 & 23  \\  
4& 25 Feb. 2002 & 02:56:42 & 0.390 & 5.5 & 29  \\  
5& 26 Feb. 2002 & 10:26:52 & 4.915 & 3.2 & 20  \\  
6& 15 Mar. 2002 & 22:23:06 & 0.243 & 4.9 & 125 \\  
7& 04 Apr. 2002 & 10:43:55 & 0.261 & 5.2 & 49  \\  
8& 04 Apr. 2002 & 15:29:16 & 2.124 & 4.7 & 32  \\  
9& 09 Apr. 2002 & 12:59:51 & 0.403 & 4.9 & 41  \\  
10& 14 Apr. 2002 & 03:24:44 & 0.715 & 4.6 & 13 \\  
11& 17 Apr. 2002 & 00:38:34 & 0.253 & 4.4 & 8  \\  
12& 24 Apr. 2002 & 21:50:23 & 0.712 & 4.0 & 16 \\  
13& 01 Jun. 2002 & 03:53:41 & 2.473 & 3.0 & 25 \\  
14& 16 Aug. 2002 & 22:10:30 & 1.629 & 4.9 & 18 \\  
15& 17 Aug. 2002 & 01:02:04 & 0.076 & 4.3 & 5  \\  
16& 23 Aug. 2002 & 11:59:05 & 0.220 & 6.4 & 14 \\  
17& 24 Aug. 2002 & 05:43:23 & 0.216 & 5.7 & 84 \\  
18& 27 Aug. 2002 & 12:28:38 & 1.617 & 3.1 & 8  \\  
19& 29 Sep. 2002 & 06:36:18 & 4.261 & 3.8 & 30 \\  
20& 29 Sep. 2002 & 14:46:43 & 0.405 & 3.9 & 40 \\  
21& 30 Sep. 2002 & 01:48:25 & 0.107 & 7.3 & 18 \\  
22& 04 Oct. 2002 & 00:41:13 & 1.109 & 4.6 & 20 \\  
23& 09 Nov. 2002 & 13:16:36 & 5.776 & 3.2 & 212\\  
24& 14 Nov. 2002 & 22:24:40 & 1.978 & 3.8 & 16 \\ \hline 
\end{tabular}
\label{eventlist}
\end{table}