\begin{table}%t2
\caption{\label{HP86}Photometry, effective temperatures, Li~equivalent widths and 
Li~abundances
for the sample of HP86. Stars marked with asterisks are in common with us.}
%\centering
\par
\begin{tabular}{ccccccc}
\hline
\hline
No. & No. & $V$ & \bmo & \teff &$EW$(Li) & \nli$_{N\rm{LTE}}$\\
P &H & & & (K) & ($\rm{m\AA}$)&\\
\hline
575 & 94 & 13.840 & 0.725 & 5425 & $<$5& $<$0.94\\
701*& 146 & 13.060 & 0.655 & 5677 &  45 &$2.15 \pm0.20$\\
790 & 185 & 12.267&  0.494 & 6325 &  42 &$2.60 \pm0.19$\\
859* & 207 & 13.200 & 0.635 & 5753 &  7 &$1.38 \pm0.20$\\
917 & 227 & 14.100 & 0.895 & 4885 &  $<$12& $<$0.82\\
921* & 229 & 12.644 & 0.518 & 6223 &  63 & $2.72  \pm0.19$ \\
953 & 237 & 12.352 & 0.565 & 6027 &  43&   $2.39  \pm0.21$\\
1017 & 265 & 13.260 & 0.625 & 5791 &  15&  $1.75  \pm0.20$\\
\hline
\end{tabular}
\end{table}