\begin{table}%t1
%\centering
\par
\caption{Basic photometric parameters of FS76 and
FS373:~reddening-corrected $V$ magnitude $m_V^0$, exposure time $t_V$
(seconds), seeing {\it FWHM}$_V$ (arcsec), and their~$R$ and $I$~band analogs,
and the $R$-band effective radius $R_{\rm e}$. \label{tab1}}
\begin{tabular}{c|ccc|ccc|ccc|c} \hline\hline\\[-3mm]
	& $m_V^0$ & $t_V$ & {\it FWHM}$_V$ & $m_R^0$ & $t_R$ & {\it FWHM}$_R$ &
$m_I^0$ & $t_I$ & {\it FWHM}$_I$ & $R_{\rm e}$~($''$/kpc) \\ \cline{1-11}
FS373 & / & 720 & 1.5$''$ & 14.17 & 360 & 1.2$''$ & 13.76 & 270 &
1.1$''$ & 7.9/1.57 \\ FS76 & 15.44 & 180 & 0.6$''$ & 14.84 & 220 &
0.9$''$ & 14.35 & 300 & 0.8$''$ & 4.4/0.77 \\\cline{1-11}
%FS76 & 15.44 & 14.84 & 14.35 &
%4.4/0.77 & 1.85 \\ \cline{1-6}
\end{tabular}
\end{table}