\begin{table}%t4
%\centering
\par
\caption{Best-fitting parameters for the chakram of Mz~3. The negative inclination means
that the chakram is inclined in the opposite direction to the other outflows.\label{T4} } 
\begin{tabular}{c c c} 
\hline\hline
Parameter & Value & Range\\ 
\noalign{\smallskip} 
\hline 
\noalign{\smallskip} 
$tD^{-1} \ \rm  (year\ kpc^{-1})$ & $1100$ & --\\ 
$\tau (^\circ)$ & $9$ & $(8 {-} 10)$\\ 
$i \ (^\circ)$ & $-65$ & $-(63 {-} 68)$\\ 
\hline 
$r_{\min} \ ('')$ & $26.5$ & $(24 {-} 30)$ \\ 
$r_{\max} \ ('')$ & $47.8$ & $(45 {-} 54)$ \\ 
$v_{\max} \ \rm (km \ s^{-1})$ & $211$ & $(206 {-} 215)$ \\ 
$v_{\min} \  \rm(km \ s^{-1})$ & $168$ & $(164 {-} 170)$ \\ 
\hline 
\end{tabular}
%\vspace{2mm}
 \end{table}