\begin{table}%t4
%\centering
\par
\caption{Broad-band fluxes from a 10 pixel aperture around \psr.}
\label{t:10pix}
\begin{tabular}{llcc}
\hline
\hline
Band    &  Pivot  & Measured    & Dereddened            \\ 
        &frequence  & flux   &    flux           \\ 
        &  log $\nu$~[Hz]    & log $F_{\nu}$~[{\rm $\mu$Jy}]    & log $F_{\nu}$~[{\rm $\mu$Jy}]       \\ 
%       &   [Hz]    & [{\rm $\mu$Jy}]    &  [{\rm $\mu$Jy}]    \\          
\hline 
{\it F336W}    & 14.950(13)         &   0.562(60)   &   0.967(60)          \\ 
{\it F547M}    & 14.737(8)         &   1.013(20)   &    1.262(20)    \\ 
{\it F555W}    & 14.741(21)        &$\le$1.141      & $\le$1.392    \\  
%F658N    & 14.658(1)         & 0.793(54)     &0.995(54)       \\
%%% why is this not included?? jesper
{\it F791W}    & 14.581(15)        & 1.271(18)      & 1.424(18) \\
\hline
\end{tabular} 
\end{table}