\begin{table}%T3
\caption{\label{tabratios}Diagnostic line ratios for the three IRS~16 sources in common with Najarro et~al. (\cite{Najarro1997}).}
%\centering
\par
\begin{tabular}{lcc}
\hline\hline
Object &~$\rm (P_{\alpha}+He)/Br_{\alpha}$ &~$\rm (Br_{\gamma}+He)/Br_{\alpha}$ \\
\hline
IRS16NE &$ 3.2 \pm 0.6~$&$ 0.28 \pm 0.03~$\\   
IRS16C  &$ 3.4 \pm 0.6~$&$ 0.26 \pm 0.03~$\\   
IRS16SW &$ 4.6 \pm 0.8~$&$ 0.43 \pm 0.04~$\\   
\hline
\end{tabular}
\end{table}