\begin{table}%tA.5
\caption{The \ion{Cr}{ii} emission lines. The line data are from Kurucz \& Bell (\cite{KB95}).}\label{tabA.5} 
%\centerline
{
\begin{tabular}{cccclrlccl}
\hline\hline
\multicolumn{1}{c}{$\lambda_{{\rm calc}}$(\AA)}&
\multicolumn{1}{c}{Elem.}&
\multicolumn{1}{c}{$\log~gf$}&
\multicolumn{1}{c}{$E_{{\rm low}}$(cm$^{-1}$)}&
\multicolumn{1}{c}{Conf.}&
\multicolumn{1}{c}{$E_{{\rm up}}$(cm$^{-1}$)}&
\multicolumn{1}{c}{Conf.}&
\multicolumn{1}{c}{$R_{\rm c}$(obs)}&
\multicolumn{1}{c}{$R_{\rm c}$(calc)}&
\multicolumn{1}{c}{Notes$^{a}$}
\\
\hline
6121.434& \ion{Cr}{ii}& $-$0.280& 89~277.950 &(5D)4d e4P& 105~609.470& (5D)4f 6G& 1.000 & 0.992&?\\
6128.189& \ion{Cr}{ii}& $-$0.492& 89~325.320 &(5D)4d e4G& 105~638.840& (5D)4f 6F& 1.007 & 0.995&\\
6158.621& \ion{Cr}{ii}& $+$0.718& 89~174.080 &(5D)4d e4G& 105~406.990& (5D)4f 4H& 0.990 & 0.928&\\
6161.031& \ion{Cr}{ii}& $+$0.573& 89~056.020 &(5D)4d e4G& 105~282.580& (5D)4f 4H& 1.002 & 0.945&\\
6172.927& \ion{Cr}{ii}& $-$0.239& 89~336.890 &(5D)4d e4P& 105~532.180& (5D)4f 4D& 1.012 & 0.991&\\
6179.226& \ion{Cr}{ii}& $-$0.055& 89~724.270 &(5D)4d f4D& 105~903.050& (5D)4f 4F& 1.007 & 0.987&\\
6181.354& \ion{Cr}{ii}& $+$0.189& 89~812.420 &(5D)4d f4D& 105~985.630& (5D)4f 4F& 1.017 & 0.978&\\
6182.340& \ion{Cr}{ii}& $+$0.452& 89~336.890 &(5D)4d e4P& 105~507.520& (5D)4f 4D& 1.023 & 0.960&\\
6186.315& \ion{Cr}{ii}& $+$0.336& 89~885.080 &(5D)4d f4D& 106~045.320& (5D)4f 4G& 1.009 & 0.971&\\
6193.551& \ion{Cr}{ii}& $+$0.012& 89~056.020 &(5D)4d e4G& 105~197.380& (5D)4f 6H& 1.000 & 0.984&\\
6209.250& \ion{Cr}{ii}& $-$0.169& 89~885.080 &(5D)4d f4D& 105~985.630& (5D)4f 4F& 1.009 & 0.990&\\
6213.078& \ion{Cr}{ii}& $+$0.037& 89~812.420 &(5D)4d f4D& 105~903.050& (5D)4f 4F& 1.008 & 0.985&\\
6213.538& \ion{Cr}{ii}& $+$0.143& 89~174.080 &(5D)4d e4G& 105~263.520& (5D)4f 6H& 1.000 & 0.979&\\
6231.676& \ion{Cr}{ii}& $+$0.061& 89~325.320 &(5D)4d e4G& 105~367.930& (5D)4f 6H& 1.000 & 0.983&\\
6237.002& \ion{Cr}{ii}& $-$0.104& 89~254.560 &(5D)4d e4P& 105~283.470& (5D)4f 4P& 1.003 & 0.988&\\
6285.601& \ion{Cr}{ii}& $-$0.229& 89~885.080 &(5D)4d f4D& 105~790.060& (5D)4f 4F& 1.028 & 0.992&\\
6299.534& \ion{Cr}{ii}& $-$0.679& 89~336.890 &(5D)4d e4P& 105~206.690& (4F)sp p4D& 1.015 &1.000& \\
6301.413& \ion{Cr}{ii}& $-$0.162& 89~812.420 &(5D)4d f4D& 105~677.490& (5D)4f 4G& 1.009 &0.990& \\
6309.669& \ion{Cr}{ii}& $-$0.013& 89~277.950 &(5D)4d e4P& 105~122.260& (5D)4f 4P& 1.013 &0.986& \\
6311.509& \ion{Cr}{ii}& $-$0.190& 89~885.080 &(5D)4d f4D& 105~724.770& (5D)4f 4G& 1.008 &0.991& \\
6324.198& \ion{Cr}{ii}& $-$0.121& 89~724.270 &(5D)4d f4D& 105~532.180& (5D)4f 4D& 1.015 &0.990& \\
6369.654& \ion{Cr}{ii}& $-$0.692& 89~812.420 &(5D)4d f4D& 105~507.520& (5D)4f 4D& 1.008 &0.997& \\
6399.280& \ion{Cr}{ii}& $+$0.004& 89~885.080 &(5D)4d f4D& 105~507.520& (5D)4f 4D& 1.004 &0.987& \\
6501.575& \ion{Cr}{ii}& $-$0.310& 90~608.990 &(5D)4d e4F& 105~985.630& (5D)4f 4F& 1.011 &0.994& \\
6526.302& \ion{Cr}{ii}& $+$0.173& 89~885.080 &(5D)4d f4D& 105~203.460& (4F)sp r4F&1.003 &0.982& \\
6536.680& \ion{Cr}{ii}& $+$0.026& 90~680.990 &(5D)4d e4F& 105~903.050& (5D)4f 4F& 1.016 &0.988& \\
6551.373& \ion{Cr}{ii}& $+$0.229& 90~725.870 &(5D)4d e4F& 105~985.630& (5D)4f 4F& 1.025 &0.982& \\
6579.572& \ion{Cr}{ii}& $+$0.215& 90~850.960 &(5D)4d e4F& 106~045.320& (5D)4f 4G& 1.019 &0.983& \\
6585.241& \ion{Cr}{ii}& $+$0.829& 90~850.960 &(5D)4d e4F& 106~032.240& (5D)4f 4G& 1.030 &0.939& \\
6592.341& \ion{Cr}{ii}& $+$0.217& 90~512.560 &(5D)4d e4F& 105~677.490& (5D)4f 4G& 1.021 &0.982& \\
6613.776& \ion{Cr}{ii}& $+$0.485& 90~608.990 &(5D)4d e4F& 105~724.770& (5D)4f 4G& 1.007 &0.968& \\
6636.427& \ion{Cr}{ii}& $+$0.573& 90~725.870 &(5D)4d e4F& 105~790.060& (5D)4f 4F& 1.029 &0.963& \\
6656.120& \ion{Cr}{ii}& $+$0.066& 90~512.560 &(5D)4d e4F& 105~532.180& (5D)4f 4D& 1.005 &0.987& \\
7211.765& \ion{Cr}{ii}& $+$0.656& 93~143.880 &(5D)5p 6F~& 107~006.290& (5D)5d 6G& 1.000 &0.963& \\
7226.064& \ion{Cr}{ii}& $+$0.791& 93~276.860 &(5D)5p 6F~& 107~111.840& (5D)5d 6G& 1.011 &0.953& \\
7242.963& \ion{Cr}{ii}& $+$0.904& 93~444.170 &(5D)5p 6F~& 107~246.870& (5D)5d 6G& 1.000 &0.943& \\
7394.889& \ion{Cr}{ii}& $+$0.451& 94~177.180 &(5D)5p 6D~& 107~696.310& (5D)5d 6D& 1.000 &0.980& \\
9448.293& \ion{Cr}{ii}& $+$0.179& 84~495.700 &(5D)5s e4D&  95~076.720& (5D)5p 4D& 1.048 &0.956&\\
9951.294& \ion{Cr}{ii}& $+$0.126& 84~209.880 &(5D)5s e4D&  94~256.070& (5D)5p 4F& 1.042 &0.971&\\
9952.493& \ion{Cr}{ii}& $+$0.318& 84~320.210 &(5D)5s e4D&  94~365.190& (5D)5p 4F& 1.024 &0.957&\\  
9970.727& \ion{Cr}{ii}& $+$0.477& 84~495.700 &(5D)5s e4D&  94~522.310& (5D)5p 4F& 1.048 &0.943&\\
9974.826& \ion{Cr}{ii}& $+$0.535& 84~726.710 &(5D)6s e4D&  94~749.200& (5D)5p 4F& 1.024 &0.938\\
\hline
\end{tabular}}
\medskip
$^{a}$ The symbol "?'' indicates doubtful emissions.
\end{table}