\begin{table}%tA.4
\caption{The \ion{Ti}{ii} emission lines. The line data are from Kurucz \& Bell (\cite{KB95}).}\label{tabA.4}
%\centering
\par
\begin{tabular}{cccclclccl}
\hline\hline
\multicolumn{1}{c}{$\lambda_{{\rm calc}}$(\AA)}&
\multicolumn{1}{c}{Elem.}&
\multicolumn{1}{c}{$\log~gf$}&
\multicolumn{1}{c}{$E_{{\rm low}}$(cm$^{-1}$)}&
\multicolumn{1}{c}{Conf.}&
\multicolumn{1}{c}{$E_{{\rm up}}$(cm$^{-1}$)}&
\multicolumn{1}{c}{Conf.}&
\multicolumn{1}{c}{$R_{\rm c}$(obs)}&
\multicolumn{1}{c}{$R_{\rm c}$(calc)}&
\multicolumn{1}{c}{Notes$^{a}$}
\\
\hline
5846.579& \ion{Ti}{ii}& $-$0.689& 64~979.150 &(3F)4d e4G& 82~078.430& (3F)4f 4G& 1.006 & 0.993\\
5921.937& \ion{Ti}{ii}& $-$0.024& 64~979.150 &(3F)4d e4G& 81~860.840& (3F)4f 4G& 1.013 & 0.971\\
5928.521& \ion{Ti}{ii}& $-$0.045& 64~979.150 &(3F)4d e4G& 81~842.090& (3F)4f 2G& 1.005 & 0.973\\ 
5929.696& \ion{Ti}{ii}& $+$0.376& 65~243.460 &(3F)4d e4G& 82~103.060& (3F)4f 4G& 1.006 & 0.936\\
5937.320& \ion{Ti}{ii}& $-$0.061& 65~446.270 &(3F)4d e4H& 82~284.220& (3F)4f 2I& 1.000 & 0.975\\
5937.412& \ion{Ti}{ii}& $+$0.152& 64~886.480 &(3F)4d e4G& 81~724.170& (3F)4f 4G& 1.008 & 0.958\\
5940.344& \ion{Ti}{ii}& $+$0.464& 65~243.460 &(3F)4d e4G& 82~072.840& (3F)4f 4H& 1.007 & 0.924\\
5940.764& \ion{Ti}{ii}& $-$0.004& 65~095.800 &(3F)4d e4G& 81~923.990& (3F)4f 2H& 1.011 & 0.971\\
5944.674& \ion{Ti}{ii}& $-$0.591& 65~095.800 &(3F)4d e4G& 81~912.920& (3F)4f 4F& 1.006 & 0.992\\
5961.332& \ion{Ti}{ii}& $-$0.317& 65~308.300 &(3F)4d e4H& 82~086.430& (3F)4f 4G& 1.009 & 0.986\\
5965.298& \ion{Ti}{ii}& $-$0.220& 64~979.150 &(3F)4d e4G& 81~738.130& (3F)4f 4I& 1.009 & 0.982\\
5969.800& \ion{Ti}{ii}& $-$0.529& 65~274.600 &(3F)4d 4D~& 82~020.940& (3F)4f 4D& 1.005 & 0.991\\
5969.818& \ion{Ti}{ii}& $-$0.534& 65~095.800 &(3F)4d e4G& 81~842.090& (3F)4f 2G& 1.005 & 0.991\\
5971.648& \ion{Ti}{ii}& $+$0.634& 64~866.480 &(3F)4d e4G& 81~627.640& (3F)4f 4H& 1.037 & 0.893\\
5979.141& \ion{Ti}{ii}& $-$0.326& 65~598.730 &(3F)4d 4D~& 82~318.910& (3F)4f 2D& 1.016 & 0.987& ? \\
5983.979& \ion{Ti}{ii}& $-$0.182& 64~979.150 &(3F)4d e4G& 81~685.810& (3F)4f 2G& 1.000 & 0.979& \\
5987.388& \ion{Ti}{ii}& $+$0.673& 64~979.150 &(3F)4d e4G& 81~676.300& (3F)4f 4H& 1.046 & 0.886\\
5988.980& \ion{Ti}{ii}& $+$0.012& 65~308.300 &(3F)4d e4H& 82~001.010& (3F)4f 2I& 1.016 & 0.971\\
5989.486& \ion{Ti}{ii}& $-$0.205& 65~460.010 &(3F)4d f2F& 82~151.310& (3F)4f 2F& 1.004 & 0.982\\
5990.839& \ion{Ti}{ii}& $-$0.105& 65~460.010 &(3F)4d f2F& 82~147.540& (3F)4f 4F& 1.002 & 0.978\\
5994.938& \ion{Ti}{ii}& $+$0.808& 65~243.460 &(3F)4d e4G& 81~919.580& (3F)4f 4I& 1.013 & 0.861\\
5995.668& \ion{Ti}{ii}& $-$0.348& 65~186.750 &(3F)4d e4H& 81~860.840& (3F)4f 4G& 1.000 & 0.987\\
5995.708& \ion{Ti}{ii}& $+$0.184& 65~460.010 &(3F)4d f2F& 82~133.990& (3F)4f 4D& 1.000 & 0.959\\
6001.395& \ion{Ti}{ii}& $+$0.751& 65~095.800 &(3F)4d e4G& 81~753.980& (3F)4f 4H& 1.051 & 0.872\\
6001.895& \ion{Ti}{ii}& $+$0.193& 65~446.270 &(3F)4d e4H& 82~103.060& (3F)4f 4G& 1.004 & 0.959\\
6002.418& \ion{Ti}{ii}& $+$0.280& 65~186.750 &(3F)4d e4H& 81~842.090& (3F)4f 2G& 1.022 & 0.948\\
6005.194& \ion{Ti}{ii}& $-$0.202& 65~598.730 &(3F)4d 4D~& 82~246.370& (3F)4f 4D& 1.000 & 0.983\\
6005.786& \ion{Ti}{ii}& $-$0.217& 65~243.460 &(3F)4d e4G& 81~889.460& (3F)4f 4I& 1.000 & 0.983\\
6012.750& \ion{Ti}{ii}& $+$1.103& 65~590.190 &(3F)4d e4H& 82~216.910& (3F)4f 4I& 0.995 & 0.792\\
6012.804& \ion{Ti}{ii}& $+$0.743& 65~446.270 &(3F)4d e4H& 82~072.840& (3F)4f 4H& 0.993 & 0.879\\
6015.753& \ion{Ti}{ii}& $-$0.040& 65~460.010 &(3F)4d f2F& 82~078.430& (3F)4f 4G& 1.000 & 0.975\\
6022.697& \ion{Ti}{ii}& $-$0.367& 65~397.570 &(3F)4d 4D~& 81~966.830& (3F)4f 4P& 1.000 & 0.988\\
6024.933& \ion{Ti}{ii}$^{*}$& $-$0.091& 65~274.600 &(3F)4d 4D~& 81~867.700& (3F)4f 4P& 1.015 & 0.977\\
6024.940& \ion{Ti}{ii}$^{*}$& $+$0.152& 65~213.800 &(3F)4d 4D~& 81~806.880& (3F)4f 4F& 1.015 & 0.961\\
6029.271& \ion{Ti}{ii}& $+$0.670& 65~308.300 &(3F)4d e4H& 81~889.460& (3F)4f 4I& 1.053 & 0.892\\
6039.682& \ion{Ti}{ii}& $+$0.264& 65~598.730 &(3F)4d 4D~& 82~151.310& (3F)4f 2F& 1.012 & 0.953\\
6040.120& \ion{Ti}{ii}& $+$0.650& 65~186.750 &(3F)4d e4H& 81~738.130& (3F)4f 4I& 1.036 & 0.896\\
6041.058& \ion{Ti}{ii}& $+$0.288& 65~598.730 &(3F)4d 4D~& 82~147.540& (3F)4f 4F& 1.000 & 0.951\\ 
6042.201& \ion{Ti}{ii}& $+$0.169& 65~397.570 &(3F)4d 4D~& 81~943.250& (3F)4f 2F& 1.035 & 0.961\\
6046.008& \ion{Ti}{ii}& $-$0.278& 65~598.730 &(3F)4d 4D~& 82~133.990& (3F)4f 4D& 1.021 & 0.986\\
6046.546& \ion{Ti}{ii}& $+$0.126& 65~308.300 &(3F)4d e4H& 81~842.090& (3F)4f 2G& 1.000 & 0.964\\
6053.297& \ion{Ti}{ii}& $+$0.169& 65~397.570 &(3F)4d 4D~& 81~912.920& (3F)4f 4F& 1.014 & 0.961\\
6059.156& \ion{Ti}{ii}& $+$0.143& 65~274.600 &(3F)4d 4D~& 81~773.980& (3F)4f 4F& 1.024 & 0.963\\
6065.306& \ion{Ti}{ii}& $+$0.379& 65~590.190 &(3F)4d e4H& 82~072.840& (3F)4f 4H& 1.000 & 0.941\\
6066.392& \ion{Ti}{ii}& $+$0.121& 65~598.730 &(3F)4d 4D~& 82~078.430& (3F)4f 4G& 1.024 & 0.966\\
6068.745& \ion{Ti}{ii}& $+$0.558& 65~446.270 &(3F)4d e4H& 81~919.580& (3F)4f 4I& 1.000 & 0.915\\
6072.446& \ion{Ti}{ii}& $+$0.141& 65~397.570 &(3F)4d 4D~& 81~860.840& (3F)4f 4G& 1.009 & 0.963\\
6073.760& \ion{Ti}{ii}& $-$0.139& 65~314.270 &(3F)4d f2F& 81~773.980& (3F)4f 4F& 1.022 & 0.980\\
6076.270& \ion{Ti}{ii}& $-$0.037& 65~460.010 &(3F)4d 4D~& 81~724.170& (3F)4f 4G& 1.008 & 0.975\\
6078.941& \ion{Ti}{ii}& $+$0.206& 65~308.300 &(3F)4d e4H& 81~753.980& (3F)4f 4H& 1.011 & 0.958\\
6079.862& \ion{Ti}{ii}& $-$0.009& 65~446.270 &(3F)4d e4H& 81~889.460& (3F)4f 4I& 1.007 & 0.974\\
6080.712& \ion{Ti}{ii}& $+$0.003& 65~186.750 &(3F)4d e4H& 81~627.640& (3F)4f 4H& 1.000 & 0.972\\
6102.542& \ion{Ti}{ii}& $+$0.178& 65~460.010 &(3F)4d f2F& 81~842.090& (3F)4f 2G& 1.011 & 0.961\\
6106.471& \ion{Ti}{ii}& $+$0.416& 65~314.270 &(3F)4d f2F& 81~685.810& (3F)4f 2G& 1.042 & 0.936\\
6107.791& \ion{Ti}{ii}& $-$0.371& 65~308.300 &(3F)4d e4H& 81~676.300& (3F)4f 4H& 1.004 & 0.988\\
6123.782& \ion{Ti}{ii}& $-$0.325& 65~598.730 &(3F)4d 4D~& 81~923.990& (3F)4f 2H& 1.006 & 0.987\\
6128.245& \ion{Ti}{ii}& $-$0.629& 65~314.270 &(3F)4d f2F& 81~627.640& (3F)4f 4H& 1.008 & 0.993\\
\hline
6141.516& \ion{Ti}{ii}& $-$0.325& 65~460.010 &(3F)4d f2F& 81~738.130& (3F)4f 4I& 1.000 & 0.987\\
6418.376& \ion{Ti}{ii}& $+$0.001& 66~794.010 &(3F)4d 2P& 82~369.970& (3F)4f 2P& 1.007 & 0.980&\\
6431.383& \ion{Ti}{ii}& $-$0.366& 66~521.010 &(3F)4d 2P& 82~043.850& (3F)4f 4P& 1.009 & 0.991&\\
6439.486& \ion{Ti}{ii}& $-$0.071& 66~794.010 &(3F)4d 2P& 82~318.910& (3F)4f 2D& 1.008 & 0.983&\\
6445.572& \ion{Ti}{ii}& $-$0.947& 66~794.010 &(3F)4d 2P& 82~304.250& (3F)4f 4S& 1.023 & 0.998& Broad\\
6961.471& \ion{Ti}{ii}& $+$0.716& 67~822.490 &(3F)4d e2G& 82~183.310& (3F)4f 2H& 1.064 & 0.934&\\
6982.314& \ion{Ti}{ii}& $+$0.454& 67~606.640 &(3F)4d e2G& 81~923.990& (3F)4f 2H& 1.015 & 0.960&\\
7012.686& \ion{Ti}{ii}& $+$0.244& 67~822.490 &(3F)4d e2G& 82~078.430& (3F)4f 4G& 1.025 & 0.979&\\
7050.978& \ion{Ti}{ii}& $+$0.118& 67~822.490 &(3F)4d e2G& 82~001.010& (3F)4f 2I& 1.018 & 0.984&\\
7074.144& \ion{Ti}{ii}& $+$0.075& 67~606.040 &(3F)4d e2G& 81~738.130& (3F)4f 4I& 1.017 & 0.986&\\
7100.431& \ion{Ti}{ii}& $-$0.040& 67~606.040 &(3F)4d e2G& 81~685.810& (3F)4f 2G& 1.013 & 0.989&\\
7105.230& \ion{Ti}{ii}& $-$0.099& 67~606.040 &(3F)4d e2G& 81~676.300& (3F)4f 4H& 1.010 & 0.990&\\
7225.270& \ion{Ti}{ii}& $+$0.335& 68~482.410 &(3F)4d 2D~& 82~318.910& (3F)4f 2D& 1.025 & 0.978&\\
7296.684& \ion{Ti}{ii}& $-$0.401& 68~364.390 &(3F)4d 2D~& 82~065.470& (3F)4f 2D& 1.025 & 0.996&\\
7297.291& \ion{Ti}{ii}& $+$1.006& 68~584.280 &(3F)4d e2H& 82~284.220& (3F)4f 2I& 1.039 & 0.918&\\
7313.279& \ion{Ti}{ii}& $+$0.793& 68~331.020 &(3F)4d e2H& 82~001.010& (3F)4f 2I& 1.051 & 0.944&\\
7351.440& \ion{Ti}{ii}& $+$0.237& 68~331.020 &(3F)4d e2H& 82~183.310& (3F)4f 2H& 1.026 & 0.983&\\
7426.911& \ion{Ti}{ii}& $-$0.902& 68~482.410 &(3F)4d 2D~& 81~943.250& (3F)4f 2F& 1.008 & 0.999& ?\\
7443.684& \ion{Ti}{ii}& $-$0.580& 68~482.410 &(3F)4d 2D~& 81~912.920& (3F)4f 4F& 1.005 & 0.997& ?\\
7447.870& \ion{Ti}{ii}& $+$0.122& 68~331.020 &(3F)4d e2H& 81~753.980& (3F)4f 4H& 1.006 & 0.987& ?\\
7574.057& \ion{Ti}{ii}& $-$0.703& 68~951.980 &(3F)4d f4F& 82~151.310& (3F)4f 2F& 1.012 & 0.998&\\
7653.044& \ion{Ti}{ii}& $+$0.606& 69~084.440 &(3F)4d f4F& 82~147.540& (3F)4f 4F& 1.016 & 0.969&\\
7679.192& \ion{Ti}{ii}& $+$0.661& 69~084.440 &(3F)4d f4F& 82~103.060& (3F)4f 4G& 1.013 & 0.965&\\
7681.729& \ion{Ti}{ii}& $+$0.194& 68~846.520 &(3F)4d f4F& 81~860.840& (3F)4f 4G& 1.012 & 0.987&\\
7706.784& \ion{Ti}{ii}& $+$0.346& 68~951.980 &(3F)4d f4F& 81~923.990& (3F)4f 2H& 1.020 & 0.982&\\
7713.367& \ion{Ti}{ii}& $+$0.273& 68~951.980 &(3F)4d f4F& 81~912.920& (3F)4f 4F& 1.011 & 0.985&\\
7716.915& \ion{Ti}{ii}& $+$0.429& 68~769.190 &(3F)4d f4F& 81~724.170& (3F)4f 4G& 1.010 & 0.978&\\
7733.343& \ion{Ti}{ii}& $+$0.035& 68~846.520 &(3F)4d f4F& 81~773.980& (3F)4f 4F& 1.013 & 0.991&\\
7786.450& \ion{Ti}{ii}& $+$0.251& 68~846.520 &(3F)4d f4F& 81~685.810& (3F)4f 2G& 1.011 & 0.986&\\
7805.972& \ion{Ti}{ii}& $+$0.128& 71~461.590 &(3F)5p 4G~& 84~268.770& (3F)5d 4G& 1.006 & 0.991& ?\\
7820.346& \ion{Ti}{ii}& $+$0.296& 71~586.060 &(3F)5p 4G~& 84~369.700& (3F)5d 4G& 1.011 & 0.987& \\
7824.913& \ion{Ti}{ii}& $+$0.984& 71~945.900 &(3F)5p 4G~& 84~722.080& (3F)5d 4H& 1.024 & 0.946& \\
7831.699& \ion{Ti}{ii}& $+$0.423& 71~747.460 &(3F)5p 4G~& 84~512.570& (3F)5d 4G& 1.016 & 0.983& \\
7845.102& \ion{Ti}{ii}& $+$0.821& 71~747.460 &(3F)5p 4G~& 84~490.760& (3F)5d 4H& 1.007 & 0.960& \\
7856.805& \ion{Ti}{ii}& $+$0.003& 68~951.980 &(3F)4d f4F& 81~676.300& (3F)4f 4H& 1.003 & 0.990&? \\
7869.297& \ion{Ti}{ii}& $+$0.616& 71~461.590 &(3F)5p 4G~& 84~165.710& (3F)5d 4H& 1.000 & 0.973&? \\
7880.457& \ion{Ti}{ii}& $+$0.506& 71~945.900 &(3F)5p 4G~& 84~632.030& (3F)5d 4G& 1.005 & 0.980&? \\
7994.391& \ion{Ti}{ii}& $+$0.566& 72~126.700 &(3F)5p 4F~& 84~632.030& (3F)5d 4G& 1.017 & 0.979& \\
8838.415& \ion{Ti}{ii}& $+$0.517& 71~945.900 &(3F)5p 4G~& 83~257.040& (3F)6s 4F& 1.016 & 0.973&? \\
8926.578& \ion{Ti}{ii}& $+$0.349& 63~445.880 &(3F)5s e2F& 74~645.080& (3F)5p 2D& 1.023 & 0.946& \\
9654.718& \ion{Ti}{ii}& $+$0.418& 63~445.880 &(3F)5s e2F& 73~800.670& (2D)sp 2F& 1.053 & 0.946& \\
9907.939& \ion{Ti}{ii}& $-$0.003& 62~180.160 &(3F)5s e4F& 72~270.310& (3F)5p 4D& 1.023 & 0.969&\\    
9931.897& \ion{Ti}{ii}& $+$0.209& 62~272.160 &(3F)5s e4F& 72~337.970& (3F)5p 4D& 1.059 & 0.953&Bad spectrum \\
9956.695& \ion{Ti}{ii}& $+$0.397& 62~410.780 &(3F)5s e4F& 72~451.520& (3F)5p 4D& 1.012 & 0.934&Bad spectrum \\
9983.462& \ion{Ti}{ii}& $+$0.557& 62~595.030 &(3F)5s e4F& 72~608.850& (3F)5p 4D& 1.058 & 0.915& \\
\hline
\end{tabular}
\medskip
$^{a}$ The symbol "*'' indicates blended lines. The symbol "?'' indicates doubtful emissions.
\end{table}