\begin{table}%T1
%\centering
\par
\caption{Photometry for HD~75289~A and B. The 2MASS Point Source catalog yield apparent
${\it JHK}_{\rm S}$ magnitudes which are confirmed in $H$ with our SofI/NTT images.}\label{photo}
\begin{tabular}{l|c|c}\hline\hline
Band& $m_{A}$ & $m_{B}$\\
\hline
$J$ & 5.346 $\pm$ 0.019 & 11.750 $\pm$ 0.036\\
$H$ & 5.187 $\pm$ 0.031 & 11.181 $\pm$ 0.031\\
$H_{\rm Sofi}$ & -- & 11.224 $\pm$ 0.040\\
$K_{\rm S}$ & 5.012 $\pm$ 0.020 & 10.879 $\pm$ 0.027\\\hline
\end{tabular}
\end{table}