\begin{table}%T5
\caption{Other sources of interest. 
Sources for which no reference is given are those from the ATCA
program with spectra that are inverted, but which do not meet our
criteria for inclusion as GPS candidates.
The spectral index, $\alpha$, is that determined between 4.8 and 
8.4~GHz from the ATCA monitoring \citep{tin03b}.
Parameters are the same as for previous tables.
}
\label{tab5}
%%\centerline
\par
%\begin{center}
{
\begin{tabular}{l l l c c c c rl r c}
\hline\hline
\noalign{\smallskip}
Source & B1950 & Refs.~$^{{a}}$  & Type & $z$ & $S_{4.8}$ & $m_{4.8}$ & \multicolumn{2}{c}{$p_{4.8}$} & $\alpha$~ & Flag \\
 &  &  &  &  & (Jy) &  & \multicolumn{2}{c}{(\%)} &  &  \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 J0106$-$4034& 0104$-$408&    & Q & 0.584& 3.56& 0.06&   1.34   &(1.4)&   0.57& c \\ 
 J0457$-$2324& 0454$-$234& T01& Q & 1.003& 2.04& 0.15&   1.44   &(3.5)&   0.23& l \\
 J0538$-$4405& 0537$-$441& T01& BL& 0.894& 3.48& 0.30&   1.28   &(1.0)&   0.15& l \\
 J1035$-$2011& 1032$-$199&    & Q & 2.198& 1.01& 0.11&   3.03   &(4.1)&   0.52& l \\ 
 J1058$-$8003& 1057$-$797& T01& Q & ...  & 2.03& 0.20&   3.14   &     &   0.16& c \\ 
 J1337$-$1257& 1334$-$127& T01& Q & 0.539& 3.55& 0.24&   3.34   &     &   0.41& l \\
 J1419$-$1928& 1417$-$192& T03& G & 0.120& 0.47& 0.07&   2.44   &     &$-$0.03& e \\
 J1743$-$0350& 1741$-$038&    & Q & 1.054& 4.43& 0.11&   0.96   &(1.2)&   0.29& c \\ 
 J1751$+$0939& 1749$+$096&    & BL& 0.322& 2.41& 0.28&   1.41   &(6.1)&   0.61& c \\ 
 J1957$-$3845& 1954$-$388& T01& Q & 0.626& 3.21& 0.26&   3.09   &(1.0)&   0.05& c \\
 J2123$+$0535& 2121$+$053&    & Q & 1.878& 0.95& 0.32&   1.17   &(2.5)&   0.54& c \\ 
 J2131$-$1207& 2128$-$123& T01& Q & 0.499& 2.55& 0.04&   1.20   &(0.6)&   0.09& c \\
 J2148$+$0657& 2145$+$067& T01& Q & 0.990& 6.33& 0.05&$<$0.5~~~&(1.0)&0.25&c \\
 J2239$-$5701& 2236$-$572&    & EF& ...  & 0.72& 0.05&   4.39   &     &   0.24& c \\ 
 J2258$-$2758& 2255$-$282& T01& Q & 0.926& 3.37& 0.10&   0.92   &     &   0.89& l \\
 J2358$-$1020& 2355$-$106&    & Q & 1.626& 1.11& 0.34&   2.84   &     &$-$0.18& c \\ 
\hline
\end{tabular}}
\\[1mm]
%\medskip
\parbox{13.5cm}{
$^{{a}}$ References:
T01 = \cite{tor01};
T03 = \cite{tay03}.}
%\end{center}
\par
\end{table}