\begin{table}%t3
%\centering
\par
\caption{Best fit Schechter parameters of the Galaxy Stellar Mass
Functions in the K20 survey. Errors indicate $1\sigma$ confidence
levels. Parameters without error have been fixed to the best fit value
of the lower $z$ bin.\label{alpha}}
     $$ 
         \begin{array}{l|l|ccc}
            \hline\hline
 \multicolumn{5}{c}{\rm  Schechter~parameters~for~the~GSMF} \\
\par
            \hline
\par
{\rm Redshift}  & ~ & \alpha & M^* & \phi^* \\
\par
            \hline
\par
0.2 \leq z < 0.7  & {\it BF} & -1.11\pm0.10  & 11.22^{+0.13}_{-0.12}  & 0.00182  \\
0.2 \leq z < 0.7  & {\it MA} & -1.10 \pm0.10  & 11.32 \pm0.11  & 0.00252  \\
            \hline
\par
0.7 \leq z < 1.0  & {\it BF} & -1.27\pm0.23  & 11.37^{+0.22}_{-0.21}  & 0.00110  \\
0.7 \leq z < 1.0  & {\it MA} & -1.36 \pm 0.23  & 11.44 \pm0.19  & 0.00132\\
\par
            \hline
\par
1.0 \leq z < 1.5  & {\it BF} & -1.27  & 10.99 ^{+0.16}_{-0.1}  & 0.00147\\
1.0 \leq z < 1.5  & {\it MA} & -1.36  & 11.20 \pm0.08  & 0.00150 \\
\par
            \hline
\par
 1.5 \leq z < 2.   & {\it BF} & -1.27 & 11.24 ^{+0.38}_{-0.18}  & 0.00067  \\
 1.5 \leq z < 2.   & {\it MA} & -1.36 & 11.63 \pm0.17  & 0.00026  \\
\par
            \hline
          \end{array}
     $$ 
   \end{table}