\begin{table}%t3
\par
%\centering
\par
\caption{{\it Top}:~continuum contrasts, $C_{\rm cont}$, derived from synthetic spectra, with
respect to the {\tt FAL~ C}-model atmosphere. The listed values from
observation refer to the average (maximum) over all observed bright point
interiors with respect to the spectrum of the reference region. 
{\it Bottom}:~filling factors derived from Eqs.~(\ref{EQ1_fillingfactor}) and~(\ref{EQ2_fillingfactor}).\label{fillingfactor_table}}
\begin{tabular}{lcrrr}
\hline 
\hline 
                    & Observation & {\tt FAL~ F} & {\tt FAL~ P} & {\tt Net} \\
\hline
$C_{\rm cont}$~ (430.31~ nm)   & --0.04 (0.14)  & 0.00  & 0.09 & 0.77 \\   
$C_{\rm cont}$~ (569.20~ nm)   &  0.02 (0.13)  & 0.00  & 0.18  & -- \\   
$C_{\rm cont}$~ (526.46~ nm)   & --0.01 (0.13)  & 0.03  & 0.25  & -- \\   
\hline
\end{tabular}
\begin{tabular}{lcc}
\hline 
\hline 
Filling factors based on...
                & {\tt FAL~ P} & {\tt Net} \\
\hline 
.. $G$-band intensity contrast  &  0.35 (0.91) & 0.08 (0.20) \\ 
.. Bright Point Index         &  0.55 (1.01) & 0.18 (0.32) \\ 
\hline
\end{tabular}
\end{table}