\begin{table}%t2
%\centering
\par
\caption{Averaged properties of bright points, based on the spectral data (Int.: interior; Surr.: surroundings; Ref.: reference).  \label{AVresults_table}  }
\begin{tabular}{lccc}
\hline
\hline
 & Int. & Surr. & Ref.\\
\hline
$G$-band contrast [\%] & 11.0  & 6.2 & 0\\
Bright Point Index                          & 0.248 & 0.142 & 0 \\
Cont. contr. at 430.41~ nm [\%] & --4.2 & --4.1 & 0 \\
Cont. contr. at 569.20~ nm [\%] &      1.7 &      0.8 & 0\\
Cont. contr. at 526.46~ nm [\%] & --1.4 & --1.9 & 0\\
Line depression CH         & 0.46 & 0.51 & 0.60\\
Line depression Fe~{\sc I}   & 0.24 & 0.27 & 0.33\\
Line depression Fe~{\sc II}  & 0.39 & 0.40 & 0.43\\
\hline
\end{tabular}
\end{table}