\begin{table} %t6
 \caption{\label{tab6}The extinction $A_V$(Balmer), $A_{V}$(IR), the  {\it SFR}$_{{\rm H}\alpha}$,
 "flux blending'' factor "FB'', the continuum colors, some important emission  line ratios, 
 the oxygen abundance in ISM and the spectral types from the diagnostic diagrams 
("H'' for \ion{H}{ii} region galaxies, "L'' for LINERs and "S'' for Seyfert~2)
for the sample galaxies. \ion{[O}{ii]} = \ion{[O}{ii]} $\lambda$3727, 
\ion{[O}{iii]} = \ion{[O}{iii]} $\lambda$4959 + \ion{[O}{iii]} $\lambda$5007, 
and \ion{[O}{iii]}$_5$ = \ion{[O}{iii]} $\lambda$5007.  "FB'' (Col.~4) refers to the possible flux blending: 
"3''~means "possible flux blending'',  "1''~means "isolated'', "0''~means "non-ISO detected''.   
For oxygen abundances (Col.~12), the right up-description  
"L''~means the values are determined from $R_3$~parameter. 
The uncertainties of the line ratios and metallicity are from the uncertainties of extinction and 
emission line flux measurements. The typical 30\% uncertainty of~{\it SFR}$_{\rm IR}$ will result 
in a typical 0.03~dex discrepancy on the derived values.} 
%\centering
\par
\begin{tabular}{lcccccccccccl} 
\hline
\hline
  Slit    &  $A_V$    &{\it SFR}$_{{\rm H}\alpha}$ & FB & $A_{V}$ & $\frac{C4861}{C3660}$  & log($\frac{\mbox{\scriptsize\ion{[O}{ii]}}}{\mbox{\scriptsize\ion{[O}{iii]}}_5}$) & log($\frac{\mbox{\scriptsize\ion{[O}{ii]}}}{{\rm H}\beta}$) & log($\frac{\mbox{\scriptsize\ion{[O}{iii]}}}{{\rm H}\beta}$) & log($R_{23}$) & log($O_{32}$) &
12+log($\frac{{\rm O}}{{\rm H}}$) & $T$  \\ 
        & Balmer        & $M_{\odot}$ yr$^{-1}$  &   &   IR &   &   &   &   &   &     & &   \\ 
\par
 (1)     &$~~$(2)$~~$ & $~~$(3) & (4) & (5) & (6) & (7) & (8) & (9) & (10) & (11) & (12) &(13) \\ \hline
  C      &         &            &   &   &   &   &   &   &   &     & &   \\ 
      2  &  2.52~$\pm$~0.96           & $\rm 56.08^{+58.51}_{-52.41}$      &  3    & 3.24   & 1.81      &   0.67~$\pm$~0.10   &  0.79~$\pm$~0.08  &   0.24~$\pm$~0.03  &  0.89~$\pm$~0.07 &  $-$0.54~$\pm$~0.10   &  8.37~$\pm$~0.11   &  H      \\
      6  &  2.35~$\pm$~0.96           & $\rm 40.35^{+40.35}_{-42.11}$      &  3    & 2.74   & 1.11      &   0.29~$\pm$~0.10   &  0.47~$\pm$~0.09  &   0.30~$\pm$~0.03  &  0.69~$\pm$~0.05 &  $-$0.17~$\pm$~0.10   &  8.69~$\pm$~0.06   &  H      \\
      8  &  2.54~$\pm$~1.17           & $\rm 71.75^{+90.79}_{-67.17}$      &  1    & 2.75   & 2.17      &       --         &   --           &   --            &       --      &    --              &      --         &  --     \\  
     10  &  1.11~$\pm$~0.93           &$~$ $\rm 6.05^{+6.13}_{-4.24}$       &  3    & 2.43   & 1.48      &   1.28~$\pm$~0.15   &  0.56~$\pm$~0.07  &$-$0.60~$\pm$~0.13  &  0.59~$\pm$~0.07 &  $-$1.16~$\pm$~0.15   &  8.72~$\pm$~0.07   &  H      \\
     11  &  3.59~$\pm$~1.40           & $\rm 97.17^{+146.9}_{-95.20}$      &  3    & 3.81   & 1.23      &   1.20~$\pm$~0.14   &  0.61~$\pm$~0.08  &$-$0.47~$\pm$~0.11  &  0.64~$\pm$~0.07 &  $-$1.07~$\pm$~0.14   &  8.67~$\pm$~0.09   &  H      \\
     12  &  1.41~$\pm$~0.90           &$~$ $\rm 4.54^{+4.44}_{-3.55}$       &  1    & 1.78   & 0.97      &       --         &     --         &   0.58~$\pm$~0.01  &    --         &   --               &  8.34~$\pm$~0.01$^{L}$ &  H  \\
     14  &  2.75~$\pm$~0.90           & $\rm 35.49^{+34.70}_{-33.71}$      &  1    & 2.18   & 1.32      &   0.73~$\pm$~0.07   &  0.67~$\pm$~0.04  &   0.06~$\pm$~0.04  &  0.77~$\pm$~0.04 &  $-$0.61~$\pm$~0.07   &  8.55~$\pm$~0.05   &  H      \\
     17  &  3.24~$\pm$~1.48           & $\rm 96.17^{+154.1}_{-93.30}$      &  1    & 2.91   & 1.73      &   1.52~$\pm$~0.20   &  0.92~$\pm$~0.09  &$-$0.48~$\pm$~0.17  &  0.93~$\pm$~0.09 &  $-$1.39~$\pm$~0.20   &  8.15~$\pm$~0.20   &  L      \\
     19  &  1.34~$\pm$~1.34           &$~$ $\rm 0.59^{+0.85}_{-0.45}$       &  3    & 3.97   & --       &       --         &     --         &   0.32~$\pm$~0.05  &       --      &      --            &  8.57~$\pm$~0.05$^{L}$  &  H \\
     25  &  $\rm 1.04^{+1.47}_{-1.04}$  &$~$$\rm 7.89^{+12.55}_{-5.35}$      &  1    & 3.77   & 2.09      &   0.50~$\pm$~0.15   &  0.48~$\pm$~0.13  &   0.10~$\pm$~0.05  &  0.63~$\pm$~0.11 &  $-$0.38~$\pm$~0.15   &  8.73~$\pm$~0.19   &  H      \\
     32  &      --                 & $~~$            --            &  1    & 3.97   & 6.24      &   1.13~$\pm$~0.13   &  1.08~$\pm$~0.10  &   0.07~$\pm$~0.07  &  1.12~$\pm$~0.09 &  $-$1.01~$\pm$~0.13   &  7.78~$\pm$~0.25   &  L      \\
     33  &  $\rm 2.59^{+3.27}_{-2.59}$  &$~$$\rm 8.83^{+31.30}_{-8.30}$      &  1    & 3.37   & 2.31      &   1.19~$\pm$~0.12   &  0.89~$\pm$~0.09  &$-$0.18~$\pm$~0.07  &  0.93~$\pm$~0.08 &  $-$1.07~$\pm$~0.12   &  8.22~$\pm$~0.16   &  L      \\ \hline
     R   &                          &           &       &   &   &   &   &   &      &  & &   \\                  4  &       --                & $~~$--                        &  3    & 3.97   & --       &   0.94~$\pm$~0.15   &  1.32~$\pm$~0.13  &   0.51~$\pm$~0.05  &  1.38~$\pm$~0.11 &  $-$0.81~$\pm$~0.15   &  7.05~$\pm$~0.41   &  L      \\
      6  &  1.78~$\pm$~1.53           &$~$$\rm 1.03^{+1.71}_{-0.88}$       &  1    & 2.42   & --       &        --        &   --           &   0.05~$\pm$~0.04  &        --     &   --               &  8.83~$\pm$~0.04$^{L}$  & L? \\
      8  &  $\rm 0.55^{+0.60}_{-0.55}$  & $\rm 16.05^{+10.39}_{-7.23}$       &  1    & 1.30   & 1.31      &   0.52~$\pm$~0.06   &  0.56~$\pm$~0.05  &   0.16~$\pm$~0.02  &  0.70~$\pm$~0.04 &  $-$0.40~$\pm$~0.06   &  8.66~$\pm$~0.04   & H       \\
      9  &      --                 & $~~$  --                      &  1    & 3.99   & 2.44      &   0.39~$\pm$~0.10   &  1.61~$\pm$~0.09  &   1.35~$\pm$~0.03  &  1.80~$\pm$~0.06 &  $-$0.26~$\pm$~0.10   &   --            & S       \\ 
     10  &  1.82~$\pm$~1.13           & $\rm 42.08^{+51.67}_{-36.25}$      &  1    & 2.59   & 1.10      &   0.71~$\pm$~0.11   &  0.53~$\pm$~0.08  &$-$0.05~$\pm$~0.06  &  0.63~$\pm$~0.06 &  $-$0.58~$\pm$~0.11   &  8.71~$\pm$~0.07  &  H       \\
     14  &  $\rm 1.72^{+3.44}_{-1.72}$  & $\rm 84.41^{+314.8}_{-71.30}$      &  1    & 0.98   & 1.39      &   0.45~$\pm$~0.48   &  0.42~$\pm$~0.42  &   0.09~$\pm$~0.07  &  0.58~$\pm$~0.29 &  $-$0.33~$\pm$~0.48   &  8.78~$\pm$~0.26  &  H       \\
     15  &  2.91~$\pm$~1.19           & $\rm 37.44^{+48.12}_{-35.84}$      &  1    & 2.25   & 1.20      &        --        &    --          &   0.07~$\pm$~0.05  &     --        &        --          &  8.81~$\pm$~0.05  &  --      \\
     20  &  1.68~$\pm$~0.70           & $\rm 84.95^{+64.50}_{-71.16}$      &  1    & 0.89   & 2.23      &   0.36~$\pm$~0.07   &  0.52~$\pm$~0.05  &   0.29~$\pm$~0.04  &  0.72~$\pm$~0.03 &  $-$0.23~$\pm$~0.07   &  8.65~$\pm$~0.04  &  H       \\
     23  &  2.49~$\pm$~0.84           & $\rm 74.07^{+67.79}_{-69.11}$      &  1    & 1.94   & 1.30      &   0.75~$\pm$~0.08   &  0.53~$\pm$~0.06  &$-$0.09~$\pm$~0.04  &  0.62~$\pm$~0.05 &  $-$0.62~$\pm$~0.08   &  8.72~$\pm$~0.05  &  H       \\
     26  &       --                &$~$  --                        &  0    & 2.34   & 2.33      &   0.89~$\pm$~0.21   &  0.76~$\pm$~0.17  &   0.00~$\pm$~0.07  &  0.83~$\pm$~0.15 &  $-$0.76~$\pm$~0.21   &  8.44~$\pm$~0.24  &  H       \\
     32  &  2.13~$\pm$~1.72           & $\rm 14.98^{+27.94}_{-13.49}$      &  1    & 1.76   & 0.84      &   0.54~$\pm$~0.10   &  0.73~$\pm$~0.08  &   0.32~$\pm$~0.04  &  0.87~$\pm$~0.06 &  $-$0.41~$\pm$~0.10   &  8.42~$\pm$~0.09  &  H       \\ \hline
     F   &                                                           &                &           &                   &                 &                  &                &                   &                   &   &   &  \\ 
      1  &  1.04~$\pm$~0.58           & $\rm 11.26^{+7.07}_{-7.61}$        &  3    & 0.25   & 1.22      &   0.38~$\pm$~0.06   &  0.55~$\pm$~0.03  &   0.29~$\pm$~0.05  &  0.74~$\pm$~0.03 &  $-$0.26~$\pm$~0.06   &  8.63~$\pm$~0.03  &  H       \\
      2  &       --                &$~$  --                        &  1    & 1.16   & 2.71      &   0.88~$\pm$~0.53   &  0.68~$\pm$~0.42  &$-$0.08~$\pm$~0.23  &  0.75~$\pm$~0.36 &  $-$0.75~$\pm$~0.53   &  8.56~$\pm$~0.49  &  H       \\
      3  &      --                 & $~$ --                        &  1    & 1.87   & 2.10      &   0.54~$\pm$~0.19   &  0.39~$\pm$~0.12  &$-$0.03~$\pm$~0.14  &  0.53~$\pm$~0.09 &  $-$0.42~$\pm$~0.19   &  8.82~$\pm$~0.07  &  H       \\
      7  &  $\rm 1.58^{+2.15}_{-1.58}$  & $\rm 11.43^{+26.58}_{-9.38}$       &  3    & 1.93   & 1.53      &   0.79~$\pm$~0.20   &  0.44~$\pm$~0.14  &$-$0.22~$\pm$~0.13  &  0.53~$\pm$~0.11 &  $-$0.66~$\pm$~0.20   &  8.81~$\pm$~0.10  &  H       \\ 
     12  &      --                 &$~$  --                        &  1    & 3.21   & 3.45      &       --         &   --           &      --         &    --         &    --              &  --            &  --      \\
     13  &  $\rm 2.39^{+3.24}_{-2.39}$  & $\rm 27.43^{+96.28}_{-25.37}$      &  3    & 2.39   & 2.80      &$-$0.23~$\pm$~0.39   &  0.86~$\pm$~0.34  &   1.21~$\pm$~0.05  &  1.37~$\pm$~0.15 &     0.12~$\pm$~0.39   &  --            &  S       \\
     15  &  1.06~$\pm$~0.92           &$~~$$\rm 0.51^{+0.50}_{-0.35}$      &  0    & 2.06   & --       &        --        &    --          &   0.41~$\pm$~0.03  & --            &    --              &  8.50~$\pm$~0.03$^{L}$ &  H  \\
     16  &  2.93~$\pm$~1.66           & $\rm 31.65^{+56.95}_{-30.34}$      &  1    & 1.68   & 1.45      &   0.46~$\pm$~0.17   &  0.21~$\pm$~0.08  &$-$0.13~$\pm$~0.15  &  0.37~$\pm$~0.07 &  $-$0.33~$\pm$~0.17   &  8.93~$\pm$~0.04  &  H       \\
     17  &  $\rm 1.78^{+2.27}_{-1.78}$  & $\rm 38.18^{+93.75}_{-32.63}$      &  1    & 2.15   & 1.52      &   1.15~$\pm$~0.19   &  0.69~$\pm$~0.15  &$-$0.33~$\pm$~0.08  &  0.73~$\pm$~0.14 &  $-$1.03~$\pm$~0.19   &  8.56~$\pm$~0.20  &  H       \\
     18  &  1.15~$\pm$~0.94           &$~$$\rm 6.20^{+6.32}_{-4.42}$       &  1    & 1.68   & 1.58      &   0.89~$\pm$~0.09   &  0.60~$\pm$~0.04  &$-$0.17~$\pm$~0.08  &  0.67~$\pm$~0.04 &  $-$0.77~$\pm$~0.09   &  8.66~$\pm$~0.04  &  H       \\
     19  &  2.33~$\pm$~0.78           & $\rm 60.94^{+51.25}_{-56.06}$      &  3    & 2.58   & 2.02      &   0.41~$\pm$~0.38   &  0.20~$\pm$~0.06  &$-$0.08~$\pm$~0.37  &  0.38~$\pm$~0.13 &  $-$0.28~$\pm$~0.38   &  8.92~$\pm$~0.08  &  H       \\
     21  &  $\rm 0.98^{+1.49}_{-0.98}$  & $\rm 14.40^{+23.22}_{-9.41}$       &  0    & 1.09   & 1.12      &   0.43~$\pm$~0.09   &  0.45~$\pm$~0.06  &   0.14~$\pm$~0.06  &  0.62~$\pm$~0.04 &  $-$0.31~$\pm$~0.09   &  8.74~$\pm$~0.04  &  H       \\
     26a &  $\rm 0.64^{+1.97}_{-0.64}$  & $\rm 10.45^{+22.28}_{-5.24}$       &  0    & 1.10   & 1.92      &$-$0.62~$\pm$~0.05   &  0.25~$\pm$~0.04  &   0.99~$\pm$~0.01  &  1.06~$\pm$~0.01 &     0.74~$\pm$~0.05   &  8.36~$\pm$~0.02  &  H       \\
     26b &  0.77~$\pm$~0.50           & $\rm 27.11^{+14.77}_{-15.29}$      &  3    & 0.41   & 1.10      &   0.21~$\pm$~0.05   &  0.50~$\pm$~0.04  &   0.41~$\pm$~0.01  &  0.76~$\pm$~0.02 &  $-$0.09~$\pm$~0.05   &  8.62~$\pm$~0.03  &  H       \\
     28  &  $\rm 2.34^{+2.07}_{-2.07}$  & $\rm 24.60^{+55.28}_{-22.66}$      &  3    & 2.85   & 1.82      &$-$0.04~$\pm$~0.19   &  0.83~$\pm$~0.17  &   0.99~$\pm$~0.03  &  1.22~$\pm$~0.07 &     0.16~$\pm$~0.19   &  --            &  S       \\
     29  &  $\rm 2.88^{+2.93}_{-2.88}$  & $\rm 23.34^{+74.03}_{-22.32}$      &  3    & 3.61   & 2.09      &   0.91~$\pm$~0.25   &  0.77~$\pm$~0.18  &$-$0.02~$\pm$~0.15  &  0.84~$\pm$~0.16 &  $-$0.79~$\pm$~0.25   &  8.43~$\pm$~0.25  &  H       \\ 
     31  &    --                   & $~~$ --                       &  3    & 2.36   & 1.64      &   0.51~$\pm$~0.29   &  0.38~$\pm$~0.26  &$-$0.01~$\pm$~0.06  &  0.53~$\pm$~0.18 &  $-$0.39~$\pm$~0.29   &  8.82~$\pm$~0.15  &  H       \\
     32  &    --                   & $~~$ --                       &  3    & 3.63   & 1.84      &   1.18~$\pm$~0.11   &  1.01~$\pm$~0.09  &$-$0.04~$\pm$~0.05  &  1.05~$\pm$~0.09 &  $-$1.05~$\pm$~0.11   &  7.96~$\pm$~0.21  &  L       \\ \hline
\end{tabular} 
\end{table}