\begin{table} %T5
 \caption{\label{tab5}Measured emission line fluxes ($F_\lambda$) in unit of 10$^{-17}$~(ergs~cm$^{-2}$~s$^{-1}$) and the errors in percent in the low-$z$ EL galaxies 
in CFRS/UDSR/UDSF fields (C/R/F). }  
%\centerline
{
\begin{tabular}{lrrrrrrrrrrrrrrrr} \hline\hline
 Slit  &    H$\beta$ & $e_{{\rm H}\beta}$\% & \ion{[O}{iii]}$_5$ & $e_{o5}$\%   & \ion{[O}{iii]}$_4$ & $e_{o4}$\% &
H$\alpha$ & $e_{{\rm H}\alpha}$\%  & \ion{[N}{ii]}$_2$  &  $e_{n2}$\% & \ion{[N}{ii]}$_{1}$ & $e_{n1}$\% & \ion{[S}{ii]}$_{1}$ 
& $e_{s1}$\% &\ion{[S}{ii]}$_{2}$ & $e_{s2}$\%  \\   
  (1) & (2) & (3) & (4) & (5) & (6) & (7) & (8) & (9) & (10) & (11) & (12) & (13) & (14) & (15)& (16)& (17) \\  \hline
  C &&&&&&&&&&&&&&&  \\
     3  &   9999  &   9999  &  1.31  &  0.19  &  9998  &  9998  &  3.45 &  0.17  &  0.54 &  0.21  &  9998 & 9998  &  9997   &  9997  & 9997   & 9997  \\ 
     9  &   2.21  &   0.11  &  0.92  &  0.18  &  0.31  &  0.06  & 10.25 &  0.09  &  3.53 &  0.12  &  1.18 & 0.12  & $<$1.38 &  --   &$<$1.65 &  --  \\        
    12  &  10.09  &   0.05  & 30.90  &  0.02  & 10.97  &  0.04  &  9999 &  9999  &  9999 &  9999  &  9999 & 9999  & 9999    &  9999  & 9999   & 9999  \\
    13  &   4.49  &   0.04  &  1.95  &  0.10  &  0.65  &  0.11  & 13.58 &  0.04  &  5.78 &  0.12  &  1.04 & 0.12  & 3.56    &  0.10  & 1.96   & 0.19  \\
    19  &   0.77  &   0.08  &  1.44  &  0.10  &  0.43  &  0.32  &  3.41 &  0.14  &  1.37 &  0.27  &  9998 & 9998  & 9997    &  9997  & 9997   & 9997  \\ 
    21  &   1.23  &   0.16  &  1.77  &  0.15  &  0.61  &  0.15  &  8.76 &  0.05  &  1.80 &  0.36  &  1.06 & 0.32  & 1.80    &  0.17  & 2.07   & 0.14  \\
    23  &   9999  &   9999  &  9999  &  9999  &  9999  &  9999  & 25.77 &  0.01  & 37.30 &  0.01  & 11.31 & 0.03  & 5.68    &  0.08  & 5.40   & 0.12  \\
    30  &   4.76  &   0.06  &  5.43  &  0.04  &  1.87  &  0.04  & 17.18 &  0.04  &  3.49 &  0.12  &  1.35 & 0.13  & 3.95    &  0.18  & 2.61   & 0.15  \\  \hline
  R &&&&&&&&&&&&&&&  \\
    1   &   4.83  &   0.10  & 13.68  &  0.02  &  4.60  &  0.05  & 17.06 &  0.02  &  2.21 &  0.10  & 9998  & 9998  & 2.95    &  0.50  & 2.68   & 0.10  \\ 
    6   &   4.62  &   0.14  &  4.31  &  0.09  &  9998  &  9998  & 19.35 &  0.03  & 12.14 &  0.08  & 3.49  & 0.10  & 6.83    &  0.15  & 4.22   & 0.40  \\ 
    11  &   4.42  &   0.05  &  3.22  &  0.08  &  0.94  &  0.06  & 13.92 &  0.03  &  8.21 &  0.03  & 9998  & 9998  & 6.16    &  0.08  & 7.19   & 0.11  \\ 
    12  &   9999  &   9999  &  9999  &  9999  &  9999  &  9999  & 11.23 &  0.03  &  6.16 &  0.07  & 9998  & 9998  & 4.42    &  0.12  & 2.73   & 0.18  \\ 
    13  &   9999  &   9999  &  9999  &  9999  &  9999  &  9999  &  4.29 &  0.08  &  2.57 &  0.10  & 9998  & 9998  & 1.49    &  0.30  & 0.70   & 0.30  \\ 
    16  &   9999  &   9999  &  9999  &  9999  &  9999  &  9999  & 24.90 &  0.01  &  5.55 &  0.04  & 9998  & 9998  & 7.62    &  0.04  & 4.81   & 0.10  \\   \hline
F &&&&&&&&&&&&&&&  \\
    11  &  10.43  &   0.03  &  6.11  &  0.07  &  9998  &  9998  & 30.10 &  0.01  & 13.76 &  0.02  & 7.50  & 0.06  & 10.32   &  0.07  & 8.59   & 0.06  \\ 
    15  &   1.87  &   0.10  &  3.92  &  0.05  &  1.49  &  0.11  &  7.98 &  0.04  &  0.75 &  0.32  & 0.60  & 0.40  & 1.71    &  0.16  & 0.82   & 0.40  \\ 
    22  &   9999  &   9999  &  4.62  &  0.08  &  1.46  &  0.21  & 30.40 &  0.02  &  9.95 &  0.05  & 2.88  & 0.17  & 7.69    &  0.05  & 6.04   & 0.13  \\  \hline
 \end{tabular} }
\smallskip
{Notes: 
      \ion{[O}{iii]}$_5$ and o5 mean \ion{[O}{iii]} $\lambda$5007; 
      \ion{[O}{iii]}$_4$ and o4 mean \ion{[O}{iii]} $\lambda$4959; 
      \ion{[N}{ii]}$_2$ and n2 mean \ion{[N}{ii]} $\lambda$6583; 
      \ion{[N}{ii]}$_1$ and n1 mean \ion{[N}{ii]} $\lambda$6548;
      \ion{[S}{ii]}$_1$ and s1 mean \ion{[S}{ii]} $\lambda$6716;
     \ion{[S}{ii]}$_2$ and s2 mean \ion{[S}{ii]} $\lambda$6731.
The H$\gamma$ emission line fluxes of
CFRS12, 19 and UDSF15 are given in Table~4.
}
\end{table}