\begin{table}%T1
\caption{\label{table_model}Parameters of the wind used for the test profiles.}
%\centering
\par
\begin{tabular}{ll}
\hline\hline
Parameter & Value\\
\hline
WR~wind & \\
$V_\infty \left[\rm km ~ s^{-1}\right]$ & 1500 km~s$^{-1}$\\
$V_{\rm turb} \left[\rm km ~ s^{-1}\right]$ & 100 km~s$^{-1}$\\
$\beta           $ & 2.0\\
$\dot M [M_\odot/\rm yr]$ &  $1\times10^{-5}~M_\odot /$yr\\
Radius                & 3 $R_\odot$\\
\hline
O~wind & \\
$V_\infty \left[\rm km ~ s^{-1}\right]$ & 3000 km~s$^{-1}$\\
$V_{\rm turb} \left[\rm km ~ s^{-1}\right]$ & 100 km~s$^{-1}$\\
$\beta            $ & 0.8\\
$\dot M [M_\odot/\rm yr]$ &  $1\times10^{-6}~M_\odot$/yr\\
Radius                & 10~$R_\odot$ \\
\hline
Orbital separation & 50 $R_\odot$\\
Orbital velocity   & 120 km~s$^{-1}$\\
$L_{\rm O}/L_{\rm WR}$       & 1.85 \\
\hline
\end{tabular}
\end{table}