\begin{table}%T5
\caption{\label{photom}$H$, $K$ and~$L$ photometry of the IRS~13E cluster and of the nearby field
stars from Table~\ref{detec}.}
%\centering
\par
        \begin{tabular}{lc c c cc}
\hline\hline
ID & $H$ & $K$ & $L$ & $H - K$ & $K - L$ \\
\hline 
W & 14.55 & 11.30 & 8.92 & 3.25 & 2.38\\
E1 & 12.74 & 10.98 & 8.59 & 1.76 & 2.39\\
E2 & 13.05 & 11.03 & 7.73 & 2.02 & 3.30\\
E4 & 14.37 & 11.72 & & 2.65 &\\
5 & 14.32 & 11.90 & & 2.42 &\\
6 & 14.71 & 12.13 & & 2.58 &\\
7 & 14.41 & 12.18 & & 2.23 &\\
8 & 14.86 & 12.23 & & 2.63 &\\
E3A & 16.48 & 12.47 & 7.50 & 4.01 & 4.97\\
10 & 15.55 & 12.80 & & 2.75 &\\
E3B & 16.95 & 13.07 & 7.92 & 3.90 & 5.14\\
12 & 15.92 & 13.28 & & 2.65 &\\
13 & 15.95 & 13.35 & & 2.60 &\\
14 & 15.95 & 13.42 & & 2.53 &\\
15 & 16.65 & 14.20 & & 2.45 &\\
16 & 16.66 & 14.22 & & 2.44 &\\
E5 & 18.19 & 14.28 & 8.48 & 3.90 & 5.79\\
18 & 16.79 & 14.52 & & 2.29 &\\
E6 & 16.24 & 14.56 & & 1.68 &\\
20 & 17.29 & 14.78 & & 2.52 &\\
\hline
       \end{tabular}
  \end{table}