\begin{table}%T2
\caption{\label{detec}Photometric measurements in all the filters, in log~($\mu$Jy), of
all the stars detected by MCS deconvolution (Sect.~\ref{reduc}) of the~$2.5\arcsec \times 2.5\arcsec$~IRS~13 field from the $H$ and~$K$p Gemini AO~images.  Measurements in the NICMOS filters~($F$) were obtained by~{\it StarFinder}, and in the $L$~band by MCS analysis. The sources are listed by
order of decreasing brightness in the $K$p~band, except IRS~13W, which is
listed first. Values preceded by~$<$ in the 1.1\micron\/ and the $L$~bands are
minima of detection, i.e. flux upper limits.}
%\centering
\par
\begin{tabular}{l | r@{} c@{} c@{} c@{} c| c | c@{} c }
\hline\hline
ID & {\it F110M} &~{\it F145M}&~{\it F160W}& ~{\it H}~& {\it F190N} & $K$p & {\it F222M} & {\it L}\\
\hline 
W & $<$0.56 & 2.58 & 3.28 & 3.20 & 3.96 & 4.27 & 4.36 & 4.89\\
E1 & 1.76 & 3.40 & 3.82 & 3.93 & 4.27 & 4.40 & 4.49 & 5.03\\
E2 & 1.61 & 3.22 & 3.71 & 3.80 & 4.17 & 4.38 & 4.48 & 5.37\\
E4 & 0.93 & 2.68 & 3.17 & 3.28 & 3.69 & 4.11 & 4.18 & $<$4.66\\
5 & 0.78 & 2.66 & 3.20 & 3.30 & 3.72 & 4.04 & 3.93 &    \\
6 & 0.39 & 2.51 & 3.07 & 3.14 & 3.57 & 3.94 & 3.89 &    \\
7 & 1.23 & 2.78 & 3.20 & 3.26 & 3.63 & 3.92 & 3.88 &    \\
8 & 0.62 & 2.55 & 3.08 & 3.08 & 3.53 & 3.90 & 3.81 &    \\
E3A & $<$0.45 & & 2.29 & 2.43 & 3.11 & 3.81 &      & 5.46\\
10 & 0.11 & 1.88 & 2.63 & 2.81 & 3.23 & 3.68 & 3.55 &    \\
E3B & $<$0.45 &  & 2.11 & 2.24 & & 3.57 &    & 5.29\\
12 & 0.69 & 1.98 & 2.62 & 2.66 & 3.15 & 3.48 & 3.45 &    \\
13 & $-$0.09 & 2.02 & 2.58 & 2.65 & 3.14 & 3.46 & 3.40 &   \\
14 & $-$0.16 & 2.01 & 2.55 & 2.65 & 3.11 & 3.43 & 3.34 &    \\
15 & $-$0.06 & 1.75 & 2.25 & 2.37 & 2.82 & 3.12 & 3.23 &   \\
16 & & 1.57 & 2.18 & 2.36 & 2.71 & 3.11 & 2.92 &     \\
E5 & $<$--0.17 & 1.60 & & 1.75 & 2.72 & 3.08 & 3.61 & 5.07\\
18 & 0.56 & 1.87 & 2.27 & 2.30 & 2.74 & 2.99 & 3.02 &   \\
E6 & $<$0.48 & & 2.46 & 2.53 & & 2.97 &     & $<$4.68\\
20 & 0.86 & 1.42 & 2.01 & 2.11 & 2.57 & 2.88 & 2.89 &    \\
\hline
        \end{tabular}
  \end{table}