\begin{table}%t9
\caption{\label{tab9}Measured rotation velocities $V_{\rm rot}$ as function of projected distance (Pos) to 
the galaxies' centers (Pos~$=$~0) for \cldrei. Galaxies are indicated by their ID with the measured emission line, respectively. 
See Fig.~\ref{fig5} for comparison.}
%\centering
\par
\begin{tabular}{ccccccc|cc}
\hline\hline
\multicolumn{1}{c}{Pos} &\multicolumn{6}{c}{$V_{\rm rot}$ sin~$i$ cos~$\delta~$} &\multicolumn{1}{c}{Pos} &\multicolumn{1}{c}{$V_{\rm rot}$ sin~$i$ cos~$\delta~$}\\
\multicolumn{1}{c}{[$''$]}&\multicolumn{6}{c}{[km s$^{-1}$]} &\multicolumn{1}{c}{[$''$]}&\multicolumn{1}{c}{[km s$^{-1}$]}\\
\hline
&B4(O[III])&B7(O[II])&B13(O[III])&B17(H$_{\beta}$)&B19(O[II])&A12(O[III])&&A9(O[II])\\
\hline     
$-$3.8&                &                &               &                &           	&$-$112.9~$\pm$~21.8&&\\
$-$3.6&                &                &               &                &           	& $-$60.1~$\pm$~36.2&&\\
$-$3.4&                &                &               &                &           	& $-$80.9~$\pm$~37.3&&\\
$-$3.2&                &                &               &                &           	& $-$87.4~$\pm$~18.2&&\\
$-$3.0&                &                &               &                &           	& $-$74.0~$\pm$~14.1&&\\
$-$2.8&                &                &               &                &           	& $-$78.7~$\pm$~14.6&&\\
$-$2.6&                &                &               &                &           	& $-$79.0~$\pm$~14.5&&\\
$-$2.4&                &                &               &                &           	& $-$63.5~$\pm$~16.0&&\\
$-$2.2&                &                &               &                &           	& $-$78.2~$\pm$~8.9&&\\
$-$2.0&                &$-$142.9~$\pm$~19.3&  	     & $-$42.2~$\pm$~33.1&  	      & $-$79.0~$\pm$~8.5&&\\
$-$1.8&                &$-$143.2~$\pm$~13.4&  	     & $-$72.7~$\pm$~42.3&  	      & $-$82.9~$\pm$~7.6&&\\
$-$1.6&                &$-$136.1~$\pm$~9.3&		    & $-$59.7~$\pm$~39.8&		     & $-$76.8~$\pm$~8.1&$-$1.5&+195.~$\pm$~71.3\\
$-$1.4& +60.7~$\pm$~23.7&$-$126.4~$\pm$~7.8&		   & $-$23.9~$\pm$~31.2&		    & $-$66.4~$\pm$~9.3&$-$1.3&+208.~$\pm$~22.4\\
$-$1.2& +60.7~$\pm$~20.5&$-$120.5~$\pm$~6.8& $-$56.6~$\pm$~3.3& $-$28.1~$\pm$~23.7& $-$33.9~$\pm$~28.5& $-$52.7~$\pm$~10.3&$-$1.1&+190.~$\pm$~12.9\\
$-$1.0& +69.6~$\pm$~21.4&$-$113.9~$\pm$~6.3& $-$46.3~$\pm$~2.8&  $-$8.0~$\pm$~16.9& $-$17.3~$\pm$~16.4& $-$39.6~$\pm$~11.6&$-$0.9&+165.~$\pm$~10.8\\
$-$0.8& +65.8~$\pm$~23.8& $-$98.7~$\pm$~6.0& $-$37.0~$\pm$~2.3&  $-$0.2~$\pm$~13.3&  $-$9.0~$\pm$~11.5& $-$25.3~$\pm$~11.6&$-$0.7&+140.~$\pm$~11.4\\
$-$0.6& +67.1~$\pm$~29.6& $-$78.2~$\pm$~5.0& $-$25.5~$\pm$~1.7&  $-$9.7~$\pm$~10.4&  $-$9.7~$\pm$~9.7& $-$20.9~$\pm$~11.9&$-$0.5&+109.~$\pm$~9.3\\
$-$0.4& +56.5~$\pm$~34.1& $-$55.1~$\pm$~4.3& $-$14.1~$\pm$~1.4& $-$13.4~$\pm$~12.1&  $-$5.4~$\pm$~7.9& $-$16.6~$\pm$~12.2&$-$0.3& +65.~$\pm$~5.4\\
$-$0.2& +24.4~$\pm$~35.4& $-$29.3~$\pm$~5.0&  $-$6.1~$\pm$~1.9&  $-$4.8~$\pm$~13.0&  $-$0.3~$\pm$~6.9& $-$12.5~$\pm$~13.2&$-$0.1& +15.~$\pm$~4.8\\
+0.0&  +0.0~$\pm$~36.3&  +0.0~$\pm$~5.8&  +0.0~$\pm$~2.5&  +0.0~$\pm$~11.8&  +0.0~$\pm$~7.0&  +0.0~$\pm$~11.8&+0.1& $-$15.~$\pm$~5.0\\
+0.2&  $-$6.3~$\pm$~30.8& +30.8~$\pm$~5.8&  +5.9~$\pm$~3.0& +17.3~$\pm$~9.6&  +4.5~$\pm$~7.1&  +1.1~$\pm$~11.6&+0.3& $-$40.~$\pm$~4.9\\
+0.4& $-$11.2~$\pm$~28.2& +57.6~$\pm$~5.5& +11.5~$\pm$~2.8& +26.1~$\pm$~10.1& +12.0~$\pm$~8.4&  +5.3~$\pm$~12.6&+0.5& $-$51.~$\pm$~5.7\\
+0.6& $-$12.2~$\pm$~39.9& +76.5~$\pm$~6.2& +13.9~$\pm$~3.1& +39.1~$\pm$~11.1& +14.6~$\pm$~10.4&  $-$5.2~$\pm$~10.7&+0.7& $-$59.~$\pm$~7.5\\
+0.8& $-$38.9~$\pm$~46.9& +93.3~$\pm$~8.1& +18.0~$\pm$~3.4& +36.1~$\pm$~16.0& +19.7~$\pm$~12.7&  $-$7.4~$\pm$~12.0&+1.9& $-$41.~$\pm$~17.8\\
+1.0& $-$89.3~$\pm$~45.7&+106.0~$\pm$~9.0& +17.5~$\pm$~3.6& +33.5~$\pm$~25.3& +39.9~$\pm$~17.0& $-$15.5~$\pm$~12.4&+1.1& $-$64.~$\pm$~31.8\\
+1.2&$-$103.9~$\pm$~43.2&+117.7~$\pm$~8.6& +18.6~$\pm$~3.6& +13.1~$\pm$~34.1& +56.0~$\pm$~20.7&  $-$6.1~$\pm$~13.1&+1.3& $-$87.~$\pm$~46.2\\
+1.4&               &+127.3~$\pm$~7.1& +24.1~$\pm$~4.3& +14.7~$\pm$~59.4&		   & +13.3~$\pm$~11.9&+1.5&$-$163.~$\pm$~44.5\\
+1.6&$-$122.5~$\pm$~48.8&+129.2~$\pm$~8.5& +26.3~$\pm$~5.7& +43.8~$\pm$~118.0&		    & +27.5~$\pm$~12.5&&\\
+1.8&$-$119.3~$\pm$~37.5&+126.0~$\pm$~10.8& +39.6~$\pm$~7.9&		    &		     & +48.8~$\pm$~12.4&&\\
+2.0&	             &+122.4~$\pm$~14.0& +72.9~$\pm$~7.3&		     &  	      & +56.7~$\pm$~13.0&&\\
+2.2&	             &                &               &                &           	& +72.0~$\pm$~13.1&&\\
+2.4&	             &                &               &                &           	& +89.3~$\pm$~13.7&&\\
+2.6&	             &                &               &                &           	&+112.1~$\pm$~13.6&&\\
+2.8&	             &                &               &                &           	&+128.6~$\pm$~11.4&&\\
+3.0&	             &                &               &                &           	&+139.5~$\pm$~9.2&&\\
+3.2&	             &                &               &                &           	&+147.8~$\pm$~7.6&&\\
+3.4&	             &                &               &                &           	&+141.2~$\pm$~8.5&&\\
+3.6&	             &                &               &                &           	&               &&\\
+3.8&	             &                &               &                &           	&+120.5~$\pm$~11.0&&\\
\hline						\end{tabular}
\end{table}