\begin{table}%t11
\caption{\label{tab11}Measured rotation velocities $V_{\rm rot}$ as function of projected distance (Pos) to 
the galaxies' centers (Pos~$=$~0) for \clvier. Galaxies are indicated by their ID with the measured emission line, respectively. 
See Fig.~\ref{fig6} for comparison.}
%\centering
\par
\begin{tabular}{ccccccc}
\hline\hline
\multicolumn{1}{c}{Pos} &\multicolumn{6}{c}{$V_{\rm rot}$ sin~$i$ cos~$\delta~$}\\
\multicolumn{1}{c}{['']}&\multicolumn{6}{c}{[km s$^{-1}$]}\\
\hline
&A8(O[II])&A11(O[III])&A13(O[II])&B6(O[II])&B10(O[III])&B14(O[II])\\
\hline     
$-$1.9&                 & $-$98.2~$\pm$~60.3&+102.2~$\pm$~46.5& 	       &		 &		   \\
$-$1.7&                 & $-$69.9~$\pm$~33.1&+112.5~$\pm$~39.3& 	       &		 &		   \\
$-$1.5& $-$65.4~$\pm$~7.2& $-$68.4~$\pm$~22.5&+104.7~$\pm$~30.9&+114.7~$\pm$~51.1& $-$48.1~$\pm$~12.9&		     \\
$-$1.3& $-$65.5~$\pm$~4.1& $-$87.1~$\pm$~24.3& +96.3~$\pm$~22.3& +89.1~$\pm$~29.2& $-$11.0~$\pm$~6.3& $-$75.5~$\pm$~146.5\\
$-$1.1& $-$57.7~$\pm$~3.9& $-$70.9~$\pm$~30.0& +84.5~$\pm$~18.3& +82.4~$\pm$~19.6&  $-$4.4~$\pm$~4.0& $-$66.3~$\pm$~103.3\\
$-$0.9& $-$53.4~$\pm$~3.9& $-$30.7~$\pm$~28.3& +70.8~$\pm$~16.0& +73.3~$\pm$~15.3&  $-$1.0~$\pm$~2.7& $-$48.8~$\pm$~56.0\\
$-$0.7& $-$46.4~$\pm$~4.0& $-$22.2~$\pm$~24.4& +61.1~$\pm$~17.2& +62.8~$\pm$~12.1&  +1.9~$\pm$~2.0& $-$20.8~$\pm$~60.2\\
$-$0.5& $-$34.5~$\pm$~4.2& $-$37.9~$\pm$~24.4& +50.7~$\pm$~18.3& +52.4~$\pm$~10.4&  +2.3~$\pm$~1.8& $-$30.2~$\pm$~47.2\\
$-$0.3& $-$17.6~$\pm$~4.3& $-$40.6~$\pm$~28.3& +34.9~$\pm$~17.6& +33.2~$\pm$~11.0&  +0.8~$\pm$~1.6&  $-$6.2~$\pm$~28.8\\
$-$0.1&  $-$8.6~$\pm$~4.8& $-$15.0~$\pm$~32.2& +13.9~$\pm$~17.4& +12.8~$\pm$~13.1&  +0.3~$\pm$~1.7&  +3.5~$\pm$~26.0\\
+0.1&  +8.6~$\pm$~5.4& +15.0~$\pm$~26.3& $-$13.9~$\pm$~15.9& $-$12.8~$\pm$~13.3&  $-$0.3~$\pm$~1.9&  $-$3.5~$\pm$~29.6\\
+0.3& +34.3~$\pm$~9.4&  +3.8~$\pm$~23.5& $-$32.1~$\pm$~13.3& $-$38.8~$\pm$~15.5&  $-$3.0~$\pm$~2.7& +28.0~$\pm$~33.8\\
+0.5& +70.3~$\pm$~10.2& +25.2~$\pm$~23.5& $-$55.3~$\pm$~11.8& $-$60.6~$\pm$~17.1&  $-$4.0~$\pm$~3.9& +69.8~$\pm$~37.8\\
+0.7& +86.6~$\pm$~14.9& +53.9~$\pm$~33.3& $-$76.8~$\pm$~11.7& $-$76.9~$\pm$~19.7&  $-$1.7~$\pm$~7.0& +73.2~$\pm$~52.3\\
+0.9&+104.3~$\pm$~18.6& +72.6~$\pm$~44.1& $-$91.5~$\pm$~12.4& $-$84.9~$\pm$~24.1& $-$11.2~$\pm$~12.1&+122.6~$\pm$~54.3\\
+1.1&+101.9~$\pm$~22.2& +62.4~$\pm$~40.3&$-$103.2~$\pm$~11.2& $-$80.1~$\pm$~33.9& $-$27.6~$\pm$~15.1&+155.1~$\pm$~51.6\\
+1.3& +96.1~$\pm$~26.9&		     &$-$111.8~$\pm$~13.4&  	      & $-$39.1~$\pm$~15.5&+146.1~$\pm$~39.9\\
+1.5& +92.3~$\pm$~32.7&		     &  	       &		& $-$41.7~$\pm$~15.5&+131.9~$\pm$~21.1\\
+1.7&                 &                &           	 &           	  & $-$36.4~$\pm$~14.0&+136.7~$\pm$~30.9\\
+1.9&                 &                &           	 &           	  & $-$22.0~$\pm$~15.7&		   \\
+2.1&                 &                &           	 &           	  &  $-$5.6~$\pm$~18.9&		    \\
\hline  						\end{tabular}
\end{table}