\begin{table}%t1
\caption{Journal of available \textit{RV}s of \ke.\label{jourv}}
%\centerline
{\begin{tabular}{ccrc}
\hline
\hline\noalign{\smallskip}
Observatory&Time interval& No. of &Dispersion\\
and source&(HJD$-$2~400~000)&spectra&(\Ame)\\
\noalign{\smallskip}\hline\noalign{\smallskip}
 1        &17~787.53--21~100.49&  9 & 10.3--37.4\\
 2        &34~944.01--35~269.09&  4 &36\\
 3        &40~765.03--40~765.24& 12 &3.9--6.8\\
 4        &47~297.76--50~742.47&752 & $R=57~000$ \\
\noalign{\smallskip}\hline
\end{tabular}}
\smallskip
{
{\it Column "Observatory and source'':}\\
1: Lick southern station in Chile: Cerro San Crist\'obal
     0.929-m reflector, 1-, 2- and 3-prism spectrographs
     (Campbell \& Moore \cite{cm});
2: Mt. Stromlo 0.762-m reflector, Cassegrain 3-prism spg.
     (Buscombe \& Morris \cite{bm});
3: Mt. Stromlo 1.88-m reflector, Coud\'e grating spg.
     (Lomb \& Shobbrook \cite{ls75});
4: ESO Coud\'e auxiliary telescope, CES CCD spg. (Paper~A).
}
\end{table}