\begin{table}%T2
\par
\caption{Observed and corrected intensity ratios of the C~IV doublet, $I$(1548.2)/$I$(1550.8).}\label{t2}
%\centerline
{
\begin{tabular}{lcc}     \hline\hline
Star  &  Observed$^{a}$  &  Corrected$^{b}$ \\  \hline
Z And      & 1.54  & 2.00  \\ 
EG And     & 1.41  & 1.48  \\ 
V 1016 Cyg & 1.31  & 1.67  \\ 
RW Hya     & 1.66  & 1.70  \\ 
SY Mus     & 1.28  & 1.36  \\  
AG~Peg     & 0.77  & 1.01  \\    
RX Pup     & 0.57  & 0.81  \\
RR Tel     & 1.16  & 1.62  \\    \hline  
\end{tabular}}
\par
\medskip
$^{a}$ Measured from {\it IUE}~spectra. \\ 
$^{b}$ After adding the flux deficit caused by fluorescence.
\end{table}