\begin{table}%t1
\caption{\label{log}The log of all the analyzed observations. The reported fluxes are relative to the fits shown in Table~\ref{fitnosoft}.}
%\centerline
{\begin{tabular}{cccccccccc}
\hline\hline
 {Object} & {Date} &\multicolumn{2}{c}{{EPIC-pn}}& {PDS} & {PDS/pn} &  {$z$} & ${N_{\rm Hg}}^{c}$ & ${F}_{\rm 2-10~keV}$ & ${\rm log}~{L_{\rm 2-10~keV}}^{d}$\\
&& {Mode}$^{a}$ & {$T^{b}$ (ks)} & {$T$ (ks)} &{factor}& & ${10^{20}}$ {cm}${^{-2}}$ & $\times10^{-11}$ (cgs) & \\
\hline {\object{ESO198-G024}} & 2001-01-23/26 & M/F &16 & 63 & 0.99 & 0.045500 &3.09 & 1.3 & 43.77\\
  {\object{MCG-02-58-022}} & 2000-12-01/05 & T/S & 7 & 47 & 0.92 & 0.047316 & 3.60 & 3.1 & 44.18\\
 {\object{NGC 7213}} & 2001-05-27/30 & T/S & 30 &38 & 0.89 &0.005977 & 2.04 & 2.2 & 42.24\\
 {\object{NGC 5548}} & 2001-07-08/12 & T/S & 49 & 48 & 0.91 &0.017175 & 1.69 & 4.0 & 43.41\\
 {\object{MKN 841}} & 2001-01-11/14 & T/S & 16 & 41 & 0.90 &0.036422 & 2.34 & 1.6 & 43.67\\
 {\object{IC 4329A}} & 2001-01-31/02-01 & M/F & 10 &16 & 1.01 &0.016054 & 4.42 & 3.7 & 43.39\\
 {\object{NGC 3516}} & 2001-04-10/12 & T/S & 57 & 40 & 1.08 &0.00884 & 3.05 & 2.4 & 42.69\\
 {\object{NGC 5506}} & 2001-02-01/03 & M/L & 14 & 38 & 1.16 &0.006181 & 3.81 & 7.8 & 42.95\\
\hline
\end{tabular}}
\smallskip
\par
$^{a}$ Filter/Frame: M~=~Medium, T~=~Thin, F~=~Full Frame, L~=~Large Window, S~=~Small Window.\\
$^{b}$ After screening for intervals of flaring particle background (see text for details).\\
$^{c}$ Values from \citet{dl90}.\\
$^{d}$ Log of luminosity corrected for absorption (see Table \ref{fitnosoft}) in erg s$^{-1}$ ($H_0=70$~km~s$^{-1}$~Mpc$^{-1}$).
\par
\end{table}