\begin{table}%t1
\caption{Sample table from the full online catalogue, columns are; catalogue~ID, RA, Dec~(J2000), multiple detection flag, ESO/SRC field number, ESO $R$-band plate epoch, Epoch difference of observations, total~$\mu$ (arcsec~per~year), error on~$\mu$ (arcsec~per~year), position angle, magnitudes~-- $B_{J}$, $R_{{\rm ESO}}$, $R_{{\rm UK}}$, $I$, $J$, $H$, $K_{{\rm S}}$.  For clarity four columns have been omitted, these are the components of the proper motion in~RA and~Dec and their errors.  In the magnitude columns~$-$1.00 indicates that no plate was scanned in for that area and~0.00 indicates that no match was found in that passband.}\label{tab1}
%\centering
\par
\begin{tabular}{c|rrr|rrr|c|r|c|c|c|c|r|c|c|c|c|c|c|c} 
\hline \hline
$N_{\rm C}$&\multicolumn{3}{c|}{RA}&\multicolumn{3}{c|}{Dec}&$F_M$&Fld&Epoch&Diff&$\mu$&$\sigma$$\mu$&PA&
$B_{J}$&$R_{{\rm ESO}}$
&$R_{{\rm UK}}$&$I$&$J$&$H$&$K$\\ \hline
1-4081&21&21&56.804&--71&40&21.44&0&75&1984.650&6.15&0.35&0.04&131.44&16.24&13.99&14.11&12.39&11.24&10.65&10.42\\
1-4082&21&22&1.192&--71&40&32.63&0&75&1984.650&6.15&0.35&0.04&130.05&16.16&13.94&14.10&12.24&11.24&10.65&10.38\\
2-4478&21&22&2.064&--43&31&3.11&0&287&1989.740&3.88&0.19&0.04&226.97&20.21&18.13&18.11&17.14&16.41&15.58&15.72\\
2-204&21&22&2.514&--22&59&32.08&0&530&1989.760&4.90&0.52&0.02&153.66&17.57&15.51&15.53&14.61&13.56&13.08&12.85\\
1-4083&21&22&13.769&--69&32&8.61&0&75&1984.650&6.15&0.24&0.02&178.36&20.03&17.85&17.83&16.79&15.67&15.21&15.05\\
2-4638&21&22&14.160&--43&59&11.59&0&287&1989.740&3.88&0.19&0.04&221.78&15.81&13.62&13.65&12.13&11.31&10.73&10.52\\
2-699&21&22&14.527&--27&2&13.68&0&530&1989.760&4.90&0.35&0.05&177.75&13.40&12.31&12.35&11.74&11.38&10.95&10.84\\
2-1383&21&22&16.964&--43&14&2.43&0&287&1989.740&3.88&0.28&0.05&173.05&14.26&11.70&12.06&10.01&9.13&8.53&8.21\\
2-3291&21&22&21.738&--19&29&38.88&0&599&1987.490&4.26&0.21&0.05&204.95&15.68&13.86&14.01&13.11&12.77&12.20&12.09\\
1-4084&21&22&24.218&--47&12&8.36&0&236&1985.766&6.88&0.39&0.06&165.01&16.38&14.07&14.30&12.03&11.09&10.53&10.26\\
2-614&21&22&24.247&--47&12&9.60&1&287&1989.740&3.88&0.36&0.05&160.30&16.39&14.22&14.44&12.40&11.09&10.53&10.26\\
2-5657&21&22&30.959&--33&27&45.66&0&402&1984.650&10.09&0.18&0.01&154.56&20.68&18.33&18.64&15.98&14.30&13.77&13.50\\
1-4085&21&22&40.096&--71&22&48.29&0&74&1985.411&8.28&0.18&0.03&156.29&14.02&11.79&11.97&10.39&9.43&8.74&8.53\\
2-456&21&22&49.556&--20&29&33.24&0&599&1987.490&4.26&0.40&0.06&112.05&15.03&12.76&12.90&10.98&10.43&9.83&9.53\\
1-4086&21&22&58.085&--47&22&17.44&0&236&1985.766&6.88&0.23&0.06&160.84&13.85&12.79&12.80&12.34&12.28&11.88&11.81\\
2-4137&21&23&0.030&--41&52&8.42&0&342&1986.590&5.17&0.20&0.03&205.25&18.04&16.13&16.20&14.45&13.14&12.65&12.45\\
2-3552&21&23&1.218&--29&32&47.73&0&465&1981.750&13.67&0.21&0.01&152.61&20.21&17.89&18.16&16.20&14.62&14.13&13.97\\
2-570&21&23&1.697&--24&57&35.04&0&530&1989.760&4.90&0.37&0.02&84.21&19.24&17.04&17.17&0.00&13.55&13.05&12.79\\
1-4087&21&23&3.648&--58&13&0.61&0&145&1984.653&6.13&0.30&0.04&128.46&15.07&13.01&13.04&11.44&10.40&9.76&9.49\\
1-4088&21&23&6.598&--50&2&21.56&0&236&1985.766&6.88&0.18&0.01&111.55&18.27&15.69&15.98&13.82&12.65&12.04&11.79\\
2-86&21&23&7.295&--28&9&48.46&0&465&1981.750&13.67&0.68&0.02&133.55&16.64&14.44&14.67&12.59&11.06&10.52&10.25\\
2-1016&21&23&7.781&--20&10&55.38&0&599&1987.490&4.26&0.31&0.02&206.11&18.62&16.64&16.61&15.28&14.26&13.73&13.47\\
2-2872&21&23&17.080&--43&52&42.13&0&287&1989.740&3.88&0.22&0.04&129.37&17.33&15.23&15.28&13.69&12.39&11.86&11.62\\
2-4742&21&23&18.438&--24&49&13.74&0&530&1989.760&4.90&0.19&0.03&159.12&17.61&15.70&15.86&14.49&13.42&12.78&12.62\\
2-3986&21&23&22.641&--45&27&34.10&0&287&1989.740&3.88&0.20&0.05&136.91&16.51&14.23&14.42&12.20&11.04&10.45&10.20\\
2-2429&21&23&23.726&--21&49&49.87&0&599&1987.490&4.26&0.23&0.06&146.15&15.85&13.43&13.57&11.28&10.48&9.96&9.65\\
2-4958&21&23&25.257&--17&38&47.43&0&599&1987.490&4.26&0.19&0.06&190.88&16.27&14.04&14.14&12.32&11.55&10.92&10.69\\
1-4089&21&23&31.292&--70&25&38.36&0&74&1985.411&8.28&0.23&0.02&140.25&20.49&18.18&18.44&17.51&16.22&15.81&15.64\\
1-4090&21&23&31.339&--70&25&38.00&1&75&1984.650&6.15&0.20&0.02&147.68&20.28&18.19&18.26&17.28&16.22&15.81&15.64\\
1-4091&21&23&33.809&--68&11&11.29&0&75&1984.650&6.15&0.33&0.03&110.00&17.98&15.71&15.80&13.62&12.18&11.61&11.29\\
2-588&21&23&37.183&--41&27&19.66&0&342&1986.590&5.17&0.37&0.03&195.15&19.09&16.98&17.06&16.17&15.23&14.79&14.47\\
2-4814&21&23&45.081&--19&52&56.74&0&599&1987.490&4.26&0.19&0.02&93.70&19.66&17.21&17.27&14.79&13.33&12.73&12.47\\
2-3636&21&23&46.792&--42&33&38.94&0&287&1989.740&3.88&0.20&0.07&142.33&16.20&14.15&14.19&12.86&12.12&11.56&11.32\\
2-315&21&23&48.695&--44&46&3.88&0&287&1989.740&3.88&0.45&0.07&125.50&15.51&13.44&13.59&11.95&11.19&10.60&10.39\\
1-4092&21&23&50.463&--64&54&30.75&0&107&1988.689&8.00&0.22&0.05&124.58&15.09&13.01&13.11&11.85&10.98&10.34&10.13\\
2-1839&21&23&50.544&--19&11&45.83&0&599&1987.490&4.26&0.25&0.05&129.72&16.68&14.52&14.59&13.32&12.59&12.01&11.85\\
1-4093&21&23&51.770&--65&34&31.11&0&107&1988.689&8.00&0.19&0.04&158.81&14.14&13.08&13.09&12.59&11.99&11.60&11.48\\
1-4094&21&23&52.780&--67&26&56.49&0&75&1984.650&6.15&0.29&0.04&153.62&22.01&19.16&19.24&17.62&16.44&16.02&15.37\\
1-4095&21&23&54.068&--73&21&50.79&0&47&1985.524&6.74&0.21&0.02&186.01&17.36&15.70&15.59&14.75&13.93&13.35&13.20\\
\hline
\end{tabular}
\end{table}