\begin{table}%t1
\caption{Inputs and extracted parameters for the model runs.}\label{tab1}
%\centering
\par
\begin{tabular}{lllllllllllll}
\hline
\hline
Run &$\rho_{{\rm inj}}$ & $\eta$ & ${\dot m}_{\rm c}$ & $y$ & ${\bar X}_{\rm s}$ & ${\bar N}$ & $\nu_{{\rm QPO}}$ & $(Rt_{\rm i})^{-1}$ & $\frac{\nu_{{\rm QPO}}}{(Rt_{\rm i})^{-1}}$ &  $R_{{\rm rms}}$  \\
 & (gm/cc) &  &   &  & & & (Hz) & & & ($\%$) \\
\hline
A.1 & 0.95e$-$14 & 90 & 0.27 & 5.1& 16 & 22~250 & 1.83e$-$6 & 3.9e$-$6 & 0.46  &  11.2 \\
&  & & &  & & & 9.15e$-$8 &  & &  \\
A.2 & 1.26e$-$14 & 142 & 0.22 & 6.6& 13 & 19~250 &  2.06e$-$6 & 5.3e$-$6 & 0.39 & 11.2  \\
& &  & & &  &  & 5.34e$-$7 & & &   \\
A.3 & 3e$-$14 & 208&  0.37  & 8.3 & 6  & 12~875 &  1.37e$-$6& 1.7e$-$5 & 0.23  &   11.2 \\
& &  & &  & & & 3.36e$-$7 & & &  \\
A.4 & 5e$-$14 & 331 & 0.39 & 9.4 & 5  & 10~500 & 6.88e$-$7 & 2.2e$-$5 & 0.03 & 3.3 \\
&  & & & & & &  3.57e$-$7  & & &  \\
\hline
B.1  & 3.6e$-$10 & 1.8& 0.05 & 0.4& 15.8  & 21~950  & 19.34  & 40 & 0.48 & 3.5\\
B.2   & 4.5e$-$10 & 1.5& 0.08 & 0.5 & 16.3 &22~050  & 19.45 & 38.5  & 0.51 &  4.0 \\
B.3   & 4.5e$-$8 & 29.4 &0.39 & 11.8 & 24  & 33~500  & 10.2& 21.3  & 0.48 &  14 \\
 & & &  & & & & 2.13 &  & & \\
B.4   & 4.5e$-$7 & 134 & 0.85 &43.4 &5 & 10~825  &  8.32  & 223  & 0.04 & 3.7 \\
 & & & & &  & & 3.58 &  & &  \\
\hline
\end{tabular}
\end{table}