\begin{table}%t3
\caption{\label{gauss2d}Angular dimensions derived from two dimensionsal
Gauss fits to maps in the 1.2 mm continuum, \NTHP, and \NTDP\ emission.}
%\centerline
{
\begin{tabular}{lcccccc}
\hline\hline
Line & Int. & $\Delta\alpha$& $\Delta\delta$ & Maj. Axis &Min. Axis & PA\\
     & \kks	      & \sec            & \sec           & \sec        & \sec  & \deg\\ 
\hline
1.2~mm  &   & --8  & 2 &  127  &  77  &  --25 \\
\NTHP~(1$-$0)   &  5.82 & --12 & 1 & 110 & 90 &	--18 \\
\NTHP~(3$-$2)   &  0.68 &  --7 & 1 &  90 & 67 &   +30 \\
\NTDP~(2$-$1)   &  1.02 &  --9 & 4 &  90 & 46 &	 --9 \\
\NTDP~(3$-$2)   &  0.34 & --11 & 5 &  63 & 38 &	--33 \\
\hline
\end{tabular}}
\smallskip
Column~2 Integrated intensity at peak; Col.~3 RA offset of peak;  
Col.~4 DEC offset of peak; Col.~5 Major axis size ({\it FWHM}); 
Col.~6 Minor axis size ({\it FWHM}); Col.~7 Position angle, 
measured East of North.
\end{table}